(kicad_sch
	(version 20260101)
	(generator "eeschema")
	(generator_version "9.99")
	(paper "A3")
	(title_block
		(title "The Lynx Mouse")
	)
	(lib_symbols
		(symbol "Device:L"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "L"
				(at -1.27 0 90)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "L"
				(at 1.905 0 90)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Inductor"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "inductor choke coil reactor magnetic"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_fp_filters" "Choke_* *Coil* Inductor_* L_*"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "L_0_1"
				(arc
					(start 0 2.54)
					(mid 0.6323 1.905)
					(end 0 1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 1.27)
					(mid 0.6323 0.635)
					(end 0 0)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 0)
					(mid 0.6323 -0.635)
					(end 0 -1.27)
					(fill
						(type none)
					)
				)
				(arc
					(start 0 -1.27)
					(mid 0.6323 -1.905)
					(end 0 -2.54)
					(fill
						(type none)
					)
				)
			)
			(symbol "L_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0402CG101J500NT"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0402CG101J500NT"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0402"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_100pF-101-5-50V_C1546.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C1546"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0402CG101J500NT_0_1"
				(polyline
					(pts
						(xy -1.27 0) (xy -0.51 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.51 2.03) (xy -0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 2.03) (xy 0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -3.81 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin input line
					(at 3.81 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0402WGF1002TCE"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0402WGF1002TCE"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0402"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_10KR-1002-1_C25744.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C25744"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0402WGF1002TCE_0_1"
				(rectangle
					(start -2.54 1.02)
					(end 2.54 -1.02)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0402WGF1581TCE"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0402WGF1581TCE"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0402"
				(at 0 -8.89 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Others_Uniroyal-Elec-0402WGF1581TCE_C113483.html"
				(at 0 -11.43 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C113483"
				(at 0 -13.97 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0402WGF1581TCE_0_1"
				(rectangle
					(start 2.54 0)
					(end 7.62 -2.54)
					(fill
						(type background)
					)
				)
				(pin unspecified line
					(at 0 -1.27 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0603WAF1001T5E"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0603WAF1001T5E"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0603"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_1KR-1001-1_C21190.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C21190"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0603WAF1001T5E_0_1"
				(rectangle
					(start -2.54 1.02)
					(end 2.54 -1.02)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0603WAF1003T5E"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0603WAF1003T5E"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0603"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_100KR-1003-1_C25803.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C25803"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0603WAF1003T5E_0_1"
				(rectangle
					(start -2.54 1.02)
					(end 2.54 -1.02)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0603WAF1500T5E"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0603WAF1500T5E"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0603"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_150R-1500-1_C22808.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C22808"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0603WAF1500T5E_0_1"
				(rectangle
					(start -2.54 1.02)
					(end 2.54 -1.02)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:0603WAF220KT5E"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "0603WAF220KT5E"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0603"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_2-2R-2R20-1_C22939.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C22939"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "0603WAF220KT5E_0_1"
				(rectangle
					(start -2.54 1.02)
					(end 2.54 -1.02)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:161N-4BVS11"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 17.78 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "161N-4BVS11"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:USB-C-SMD_HANELECTRICITY_161N-4XVS11"
				(at 0 -15.24 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C5440752"
				(at 0 -17.78 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "161N-4BVS11_0_1"
				(rectangle
					(start -10.16 10.16)
					(end -9.65 9.65)
					(fill
						(type background)
					)
				)
				(circle
					(center -8.89 8.89)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 10.16 5.08 180)
					(length 2.54)
					(name "GND")
					(number "B1A12")
				)
				(pin unspecified line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "VBUS")
					(number "B4A9")
				)
				(pin unspecified line
					(at 10.16 0 180)
					(length 2.54)
					(name "SBU2")
					(number "B8")
				)
				(pin unspecified line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "DN2")
					(number "B7")
				)
				(pin unspecified line
					(at 10.16 -5.08 180)
					(length 2.54)
					(name "DP2")
					(number "B6")
				)
				(pin unspecified line
					(at 10.16 -7.62 180)
					(length 2.54)
					(name "CC2")
					(number "B5")
				)
				(pin unspecified line
					(at 0 12.7 270)
					(length 2.54)
					(name "EP")
					(number "0")
				)
				(pin unspecified line
					(at -12.7 -7.62 0)
					(length 2.54)
					(name "SBU1")
					(number "A8")
				)
				(pin unspecified line
					(at -12.7 -5.08 0)
					(length 2.54)
					(name "DN1")
					(number "A7")
				)
				(pin unspecified line
					(at -12.7 -2.54 0)
					(length 2.54)
					(name "DP1")
					(number "A6")
				)
				(pin unspecified line
					(at -12.7 0 0)
					(length 2.54)
					(name "CC1")
					(number "A5")
				)
				(pin unspecified line
					(at -12.7 2.54 0)
					(length 2.54)
					(name "VBUS")
					(number "A4B9")
				)
				(pin unspecified line
					(at -12.7 5.08 0)
					(length 2.54)
					(name "GND")
					(number "A1B12")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:2541WR-05P"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 10.16 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "2541WR-05P"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:HDR-TH_5P-P2.54-H-M-W10.4"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C5383098"
				(at 0 -15.24 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "2541WR-05P_0_1"
				(rectangle
					(start -2.54 7.62)
					(end -2.03 7.11)
					(fill
						(type background)
					)
				)
				(circle
					(center -1.27 6.35)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 5.08 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "3")
					(number "3")
				)
				(pin unspecified line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "4")
					(number "4")
				)
				(pin unspecified line
					(at -5.08 -5.08 0)
					(length 2.54)
					(name "5")
					(number "5")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:3K32.768AQ"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "3K32.768AQ"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:OSC-SMD_L3.2-W1.5"
				(at 0 -8.89 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C19723463"
				(at 0 -11.43 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "3K32.768AQ_0_1"
				(polyline
					(pts
						(xy 2.54 -1.27) (xy 3.81 -1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.81 0) (xy 3.81 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 0) (xy 5.08 0)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 5.08 0) (xy 5.08 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -3.81) (xy 5.08 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -3.81) (xy 5.08 -3.81)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 6.35 0) (xy 6.35 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.35 -1.27) (xy 7.62 -1.27)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 0 -1.27 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:A-IPEX1-1.25A"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "RF"
				(at 0 10.16 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "A-IPEX1-1.25A"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:IPEX-SMD_3P-L2.6-W2.6-LS3.0_RF1200001R"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C22467595"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "A-IPEX1-1.25A_0_1"
				(rectangle
					(start -2.54 0)
					(end 2.54 -5.08)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 0 -2.03) (xy 0 0)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0 -2.54)
					(radius 0.51)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 7.62 -2.54 180)
					(length 5.08)
					(name "3")
					(number "3")
				)
				(pin unspecified line
					(at -7.62 -2.54 0)
					(length 5.08)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at 0 5.08 270)
					(length 5.08)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:AC0402JR-075R6L"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "AC0402JR-075R6L"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0402"
				(at 0 -8.89 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Others_YAGEO-AC0402JR-075R6L_C227401.html"
				(at 0 -11.43 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C227401"
				(at 0 -13.97 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "AC0402JR-075R6L_0_1"
				(rectangle
					(start 2.54 0)
					(end 7.62 -2.54)
					(fill
						(type background)
					)
				)
				(pin unspecified line
					(at 10.16 -1.27 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at 0 -1.27 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:C2012X5R1A336MTJ00E"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "C2012X5R1A336MTJ00E"
				(at 0 -15.24 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0805"
				(at 0 -17.78 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Others_TDK-C2012X5R1A336MTJ00E_C342635.html"
				(at 0 -20.32 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C342635"
				(at 0 -22.86 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "C2012X5R1A336MTJ00E_0_1"
				(polyline
					(pts
						(xy 0 -5.08) (xy 3.81 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 -5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 -6.35) (xy 2.54 -7.62)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.81 -6.35) (xy 0 -6.35)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 2.54 0 270)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at 2.54 -10.16 90)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:CL05A105KA5NQNC"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "CL05A105KA5NQNC"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0402"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A105KA5NQNC_1uF-105-10-25V_C52923.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C52923"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "CL05A105KA5NQNC_0_1"
				(polyline
					(pts
						(xy -0.51 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.51 -2.03) (xy -0.51 2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 2.03) (xy 0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 0.51 0)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:CL05A106MQ5NUNC"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "CL05A106MQ5NUNC"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0402"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A106MQ5NUNC_10uF-106-20-6-3V_C15525.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C15525"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "CL05A106MQ5NUNC_0_1"
				(polyline
					(pts
						(xy -1.27 0) (xy -0.51 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.51 2.03) (xy -0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 2.03) (xy 0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 0) (xy 1.27 0)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at -3.81 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin input line
					(at 3.81 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:CL05B104KO5NNNC"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "CL05B104KO5NNNC"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0402"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05B104KO5NNNC_100nF-104-10-16V_C1525.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C1525"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "CL05B104KO5NNNC_0_1"
				(polyline
					(pts
						(xy -0.51 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.51 -2.03) (xy -0.51 2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 2.03) (xy 0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 0.51 0)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:CL10A475KO8NNNC"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "CL10A475KO8NNNC"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0603"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL10A475KO8NNNC_4-7uF-475-10-16V_C19666.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C19666"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "CL10A475KO8NNNC_0_1"
				(polyline
					(pts
						(xy -0.51 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.51 -2.03) (xy -0.51 2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.51 2.03) (xy 0.51 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 0.51 0)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:CSA0402C0G120J500GT"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 2.54 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "CSA0402C0G120J500GT"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0402"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C18220923"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "CSA0402C0G120J500GT_0_1"
				(polyline
					(pts
						(xy 5.08 -2.54) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -3.81) (xy 5.08 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.35 0) (xy 6.35 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 -2.54) (xy 6.35 -2.54)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 0 -2.54 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:D2F-01"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "SW"
				(at 0 7.62 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "D2F-01"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:SW-TH_D2F-01"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Microswitches_Omron-Electronics-D2F-01_C397278.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C397278"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "D2F-01_0_1"
				(polyline
					(pts
						(xy -3.05 0) (xy -5.08 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.54 0.51) (xy 2.54 2.03)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center -2.54 0)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 1.27) (xy 0 3.81)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 2.54)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 0)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.05 2.54) (xy 5.08 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.05 0) (xy 5.08 0)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 7.62 2.54 180)
					(length 2.54)
					(name "NC")
					(number "3")
				)
				(pin unspecified line
					(at 7.62 0 180)
					(length 2.54)
					(name "ON")
					(number "2")
				)
				(pin unspecified line
					(at -7.62 0 0)
					(length 2.54)
					(name "COM")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:DM-1A-135R-Z"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "SW"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "DM-1A-135R-Z"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:SW-TH_DM-1A-135R-Z"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C22459524"
				(at 0 -15.24 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "DM-1A-135R-Z_0_1"
				(rectangle
					(start -7.62 5.08)
					(end -7.11 4.57)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -6.35 5.08) (xy -6.35 5.84) (xy -5.08 5.84) (xy -5.08 5.08)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -5.08 -2.54) (xy -5.08 0) (xy -3.56 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -3.56 0) (xy -1.78 1.02)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.78 0) (xy 0 0) (xy 0 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 2.54 2.03) (xy -2.29 2.03) (xy -2.29 0.51)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 -5.08 90)
					(length 5.08)
					(name "COM")
					(number "1")
				)
				(pin unspecified line
					(at 0 -5.08 90)
					(length 5.08)
					(name "NO")
					(number "2")
				)
				(pin unspecified line
					(at 2.54 -5.08 90)
					(length 5.08)
					(name "NC")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:DS8562-33S5"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 7.62 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "DS8562-33S5"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BL"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C5884114"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "DS8562-33S5_0_1"
				(rectangle
					(start -7.62 5.08)
					(end -7.11 4.57)
					(fill
						(type background)
					)
				)
				(circle
					(center -6.35 3.81)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 10.16 2.54 180)
					(length 2.54)
					(name "VOUT")
					(number "5")
				)
				(pin unspecified line
					(at 10.16 0 180)
					(length 2.54)
					(name "NC")
					(number "4")
				)
				(pin unspecified line
					(at -10.16 -2.54 0)
					(length 2.54)
					(name "EN")
					(number "3")
				)
				(pin unspecified line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin unspecified line
					(at -10.16 2.54 0)
					(length 2.54)
					(name "VIN")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:FPC11-X1.0-8AH2.5"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 20.32 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "FPC11-X1.0-8AH2.5"
				(at 0 -17.78 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:FPC-SMD_8P-P1.00_XYECONN_FPC10-S1.0-8AH2.5"
				(at 0 -20.32 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C19269896"
				(at 0 -22.86 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "FPC11-X1.0-8AH2.5_0_1"
				(rectangle
					(start -2.54 12.7)
					(end -2.03 12.19)
					(fill
						(type background)
					)
				)
				(circle
					(center -1.27 11.43)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 2.54 -12.7 90)
					(length 2.54)
					(name "9")
					(number "9")
				)
				(pin unspecified line
					(at 2.54 15.24 270)
					(length 2.54)
					(name "10")
					(number "10")
				)
				(pin unspecified line
					(at -5.08 -7.62 0)
					(length 2.54)
					(name "8")
					(number "8")
				)
				(pin unspecified line
					(at -5.08 -5.08 0)
					(length 2.54)
					(name "7")
					(number "7")
				)
				(pin unspecified line
					(at -5.08 -2.54 0)
					(length 2.54)
					(name "6")
					(number "6")
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "5")
					(number "5")
				)
				(pin unspecified line
					(at -5.08 2.54 0)
					(length 2.54)
					(name "4")
					(number "4")
				)
				(pin unspecified line
					(at -5.08 5.08 0)
					(length 2.54)
					(name "3")
					(number "3")
				)
				(pin unspecified line
					(at -5.08 7.62 0)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at -5.08 10.16 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:HC-PH-2AW-TW"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "HC-PH-2AW-TW"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:HDR-TH_2P-P2.00-H-F-W6.0"
				(at 0 -8.89 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C19273675"
				(at 0 -11.43 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "HC-PH-2AW-TW_0_1"
				(rectangle
					(start -2.54 3.81)
					(end -2.03 3.3)
					(fill
						(type background)
					)
				)
				(circle
					(center -1.27 2.54)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 1.27 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at -5.08 -1.27 0)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:HCZZ0001-12"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "CN"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "HCZZ0001-12"
				(at 0 -44.45 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:CONN-SMD_HCZZ0001-12"
				(at 0 -46.99 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C7433463"
				(at 0 -49.53 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "HCZZ0001-12_0_1"
				(rectangle
					(start 3.81 -3.81)
					(end 12.7 -36.83)
					(fill
						(type background)
					)
				)
				(circle
					(center 5.08 -5.08)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 1.27 -6.35 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 1.27 -8.89 0)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at 1.27 -11.43 0)
					(length 2.54)
					(name "3")
					(number "3")
				)
				(pin unspecified line
					(at 1.27 -13.97 0)
					(length 2.54)
					(name "4")
					(number "4")
				)
				(pin unspecified line
					(at 1.27 -16.51 0)
					(length 2.54)
					(name "5")
					(number "5")
				)
				(pin unspecified line
					(at 1.27 -19.05 0)
					(length 2.54)
					(name "6")
					(number "6")
				)
				(pin unspecified line
					(at 1.27 -21.59 0)
					(length 2.54)
					(name "7")
					(number "7")
				)
				(pin unspecified line
					(at 1.27 -24.13 0)
					(length 2.54)
					(name "8")
					(number "8")
				)
				(pin unspecified line
					(at 1.27 -26.67 0)
					(length 2.54)
					(name "9")
					(number "9")
				)
				(pin unspecified line
					(at 1.27 -29.21 0)
					(length 2.54)
					(name "10")
					(number "10")
				)
				(pin unspecified line
					(at 1.27 -31.75 0)
					(length 2.54)
					(name "11")
					(number "11")
				)
				(pin unspecified line
					(at 1.27 -34.29 0)
					(length 2.54)
					(name "12")
					(number "12")
				)
				(pin unspecified line
					(at 11.43 -39.37 90)
					(length 2.54)
					(name "13")
					(number "13")
				)
				(pin unspecified line
					(at 11.43 -1.27 270)
					(length 2.54)
					(name "14")
					(number "14")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:KT-0603R"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "LED"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "KT-0603R"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:LED0603-RD"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Light-Emitting-Diodes-LED_Red-LED-0603_C2286.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C2286"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "KT-0603R_0_1"
				(polyline
					(pts
						(xy -3.81 3.3) (xy -2.79 2.79) (xy -3.3 2.29) (xy -3.81 3.3)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -2.79 4.32) (xy -1.78 3.81) (xy -2.29 3.3) (xy -2.79 4.32)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy -2.03 1.52) (xy -3.81 3.3)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.03) (xy -1.27 -2.03)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.02 2.54) (xy -2.79 4.32)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 -1.52) (xy -1.27 0) (xy 1.27 1.78) (xy 1.27 -1.52)
					)
					(fill
						(type background)
					)
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 3.81)
					(name "K")
					(number "1")
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 3.81)
					(name "A")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:MBR0540_C22378362"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "D"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "MBR0540_C22378362"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:SOD-123FL_L2.7-W1.8-LS3.8-RD"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C22378362"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "MBR0540_C22378362_0_1"
				(polyline
					(pts
						(xy -2.03 1.52) (xy -2.03 1.78) (xy -1.52 1.78) (xy -1.52 -2.03) (xy -1.02 -2.03) (xy -1.02 -1.78)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.52) (xy -1.27 0) (xy 1.27 -1.78) (xy 1.27 1.52)
					)
					(fill
						(type background)
					)
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 3.81)
					(name "K")
					(number "1")
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 3.81)
					(name "A")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:MCP73833-AMI_MF"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 12.7 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "MCP73833-AMI/MF"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:DFN-10_L3.0-W3.0-P0.50-BL-EP-1"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C635264"
				(at 0 -15.24 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "MCP73833-AMI_MF_0_1"
				(rectangle
					(start -12.7 10.16)
					(end -12.19 9.65)
					(fill
						(type background)
					)
				)
				(circle
					(center -11.43 6.35)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 15.24 7.62 180)
					(length 2.54)
					(name "PAD")
					(number "11")
				)
				(pin unspecified line
					(at 15.24 5.08 180)
					(length 2.54)
					(name "VBAT")
					(number "10")
				)
				(pin unspecified line
					(at 15.24 2.54 180)
					(length 2.54)
					(name "VBAT")
					(number "9")
				)
				(pin unspecified line
					(at 15.24 0 180)
					(length 2.54)
					(name "THERM")
					(number "8")
				)
				(pin unspecified line
					(at 15.24 -2.54 180)
					(length 2.54)
					(name "PG#(TE#）")
					(number "7")
				)
				(pin unspecified line
					(at 15.24 -5.08 180)
					(length 2.54)
					(name "PROG")
					(number "6")
				)
				(pin unspecified line
					(at -15.24 -5.08 0)
					(length 2.54)
					(name "VSS")
					(number "5")
				)
				(pin unspecified line
					(at -15.24 -2.54 0)
					(length 2.54)
					(name "STAT2")
					(number "4")
				)
				(pin unspecified line
					(at -15.24 0 0)
					(length 2.54)
					(name "STAT1")
					(number "3")
				)
				(pin unspecified line
					(at -15.24 2.54 0)
					(length 2.54)
					(name "VDD")
					(number "2")
				)
				(pin unspecified line
					(at -15.24 5.08 0)
					(length 2.54)
					(name "VDD")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:PAW3395DM-T6QU_C41346211"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 2.54 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "PAW3395DM-T6QU_C41346211"
				(at 0 -43.18 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:PDIP-16_L16.2-W9.1-P1.78-TL_PMW3389DM-T3QU"
				(at 0 -45.72 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C41346211"
				(at 0 -48.26 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "PAW3395DM-T6QU_C41346211_0_1"
				(rectangle
					(start 3.81 0)
					(end 26.67 -40.64)
					(fill
						(type background)
					)
				)
				(circle
					(center 5.08 -1.27)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 1.27 -2.54 0)
					(length 2.54)
					(name "MOSI")
					(number "11")
				)
				(pin unspecified line
					(at 1.27 -5.08 0)
					(length 2.54)
					(name "MOTION")
					(number "9")
				)
				(pin unspecified line
					(at 1.27 -12.7 0)
					(length 2.54)
					(name "LED_P")
					(number "15")
				)
				(pin unspecified line
					(at 1.27 -15.24 0)
					(length 2.54)
					(name "MISO")
					(number "12")
				)
				(pin unspecified line
					(at 1.27 -17.78 0)
					(length 2.54)
					(name "NRESET")
					(number "14")
				)
				(pin unspecified line
					(at 1.27 -20.32 0)
					(length 2.54)
					(name "SCLK")
					(number "10")
				)
				(pin unspecified line
					(at 1.27 -27.94 0)
					(length 2.54)
					(name "NC")
					(number "1")
				)
				(pin unspecified line
					(at 1.27 -30.48 0)
					(length 2.54)
					(name "NC")
					(number "2")
				)
				(pin unspecified line
					(at 1.27 -33.02 0)
					(length 2.54)
					(name "NC")
					(number "6")
				)
				(pin unspecified line
					(at 1.27 -35.56 0)
					(length 2.54)
					(name "NC")
					(number "16")
				)
				(pin unspecified line
					(at 1.27 -38.1 0)
					(length 2.54)
					(name "NCS")
					(number "13")
				)
				(pin unspecified line
					(at 29.21 -38.1 180)
					(length 2.54)
					(name "GNDIO")
					(number "8")
				)
				(pin unspecified line
					(at 29.21 -35.56 180)
					(length 2.54)
					(name "GND")
					(number "3")
				)
				(pin unspecified line
					(at 29.21 -7.62 180)
					(length 2.54)
					(name "VDDREG")
					(number "5")
				)
				(pin unspecified line
					(at 29.21 -5.08 180)
					(length 2.54)
					(name "VDDIO")
					(number "7")
				)
				(pin unspecified line
					(at 29.21 -2.54 180)
					(length 2.54)
					(name "VDD")
					(number "4")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:PESD3V3Y1BSFYL"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "D"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "PESD3V3Y1BSFYL"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C552535"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "PESD3V3Y1BSFYL_0_1"
				(polyline
					(pts
						(xy -2.54 -1.78) (xy 0 0) (xy -2.54 1.78) (xy -2.54 -1.78)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 0.51 1.78) (xy 0 1.02) (xy 0 -1.02) (xy -0.51 -1.78)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 1.78) (xy 0 0) (xy 2.54 -1.78) (xy 2.54 1.78)
					)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 3.81 0) (xy 2.54 0)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:RCA025K1JLF"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "RCA025K1JLF"
				(at 0 -5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0402"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C22356228"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "RCA025K1JLF_0_1"
				(rectangle
					(start -2.54 1.27)
					(end 2.54 -1.27)
					(fill
						(type background)
					)
				)
				(pin unspecified line
					(at 5.08 0 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at -5.08 0 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:RTT02220JTH"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "RTT02220JTH"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0402"
				(at 0 -8.89 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount_22R-220-5_C102894.html"
				(at 0 -11.43 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C102894"
				(at 0 -13.97 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "RTT02220JTH_0_1"
				(rectangle
					(start 3.81 0)
					(end 8.89 -2.54)
					(fill
						(type background)
					)
				)
				(pin input line
					(at 11.43 -1.27 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin input line
					(at 1.27 -1.27 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:TCC0402COG1R2C500AT"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "C"
				(at 0 2.54 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "TCC0402COG1R2C500AT"
				(at 0 -7.62 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:C0402"
				(at 0 -10.16 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C880658"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "TCC0402COG1R2C500AT_0_1"
				(polyline
					(pts
						(xy 5.08 -2.54) (xy 2.54 -2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 5.08 -3.81) (xy 5.08 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.35 0) (xy 6.35 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 7.62 -2.54) (xy 6.35 -2.54)
					)
					(fill
						(type none)
					)
				)
				(pin unspecified line
					(at 0 -2.54 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin unspecified line
					(at 10.16 -2.54 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:WR04X222JTL"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "R"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "WR04X222JTL"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:R0402"
				(at 0 -8.89 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount_2-2KR-222-5_C168260.html"
				(at 0 -11.43 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C168260"
				(at 0 -13.97 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "WR04X222JTL_0_1"
				(rectangle
					(start 3.81 0)
					(end 8.89 -2.54)
					(fill
						(type background)
					)
				)
				(pin unspecified line
					(at 11.43 -1.27 180)
					(length 2.54)
					(name "2")
					(number "2")
				)
				(pin unspecified line
					(at 1.27 -1.27 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "EasyEDA:XL7EL89CKI-111YLC-32M"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "X"
				(at 0 2.54 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "XL7EL89CKI-111YLC-32M"
				(at 0 -12.7 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "EasyEDA:CRYSTAL-SMD_4P-L2.0-W1.6-BL"
				(at 0 -15.24 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "LCSC Part" "C2965582"
				(at 0 -17.78 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "XL7EL89CKI-111YLC-32M_0_1"
				(rectangle
					(start 2.54 0)
					(end 12.7 -10.16)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 2.54 -7.62) (xy 5.08 -7.62) (xy 5.08 -5.08) (xy 6.35 -5.08)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 3.81 -8.89)
					(radius 0.38)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 6.35 -7.62) (xy 6.35 -3.81)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 7.62 -3.81)
					(end 8.89 -7.62)
					(fill
						(type background)
					)
				)
				(polyline
					(pts
						(xy 8.89 -7.62) (xy 8.89 -3.81)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 12.7 -2.54) (xy 10.16 -2.54) (xy 10.16 -5.08) (xy 8.89 -5.08)
					)
					(fill
						(type none)
					)
				)
				(pin input line
					(at 0 -7.62 0)
					(length 2.54)
					(name "1")
					(number "1")
				)
				(pin input line
					(at 15.24 -2.54 180)
					(length 2.54)
					(name "3")
					(number "3")
				)
				(pin input line
					(at 0 -2.54 0)
					(length 2.54)
					(name "GND")
					(number "4")
				)
				(pin input line
					(at 15.24 -7.62 180)
					(length 2.54)
					(name "GND")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Jumper:SolderJumper_3_Bridged12"
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom no)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "JP"
				(at -2.54 -2.54 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "SolderJumper_3_Bridged12"
				(at 0 2.794 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "3-pole Solder Jumper, pins 1+2 closed/bridged"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "Solder Jumper SPDT"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_fp_filters" "SolderJumper*Bridged12*"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "SolderJumper_3_Bridged12_0_1"
				(polyline
					(pts
						(xy -2.54 0) (xy -2.032 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.016 1.016) (xy -1.016 -1.016)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.016 0.508)
					(end -0.508 -0.508)
					(fill
						(type outline)
					)
				)
				(arc
					(start -1.016 -1.016)
					(mid -2.0276 0)
					(end -1.016 1.016)
					(fill
						(type none)
					)
				)
				(arc
					(start -1.016 -1.016)
					(mid -2.0276 0)
					(end -1.016 1.016)
					(fill
						(type outline)
					)
				)
				(rectangle
					(start -0.508 1.016)
					(end 0.508 -1.016)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 0 -1.27) (xy 0 -1.016)
					)
					(fill
						(type none)
					)
				)
				(arc
					(start 1.016 1.016)
					(mid 2.0276 0)
					(end 1.016 -1.016)
					(fill
						(type none)
					)
				)
				(arc
					(start 1.016 1.016)
					(mid 2.0276 0)
					(end 1.016 -1.016)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 1.016 1.016) (xy 1.016 -1.016)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 2.032 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "SolderJumper_3_Bridged12_1_1"
				(pin passive line
					(at -5.08 0 0)
					(length 2.54)
					(name "A")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.54)
					(name "C")
					(number "2")
				)
				(pin passive line
					(at 5.08 0 180)
					(length 2.54)
					(name "B")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "MCU_Nordic:nRF52833_QDxx"
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "U"
				(at 0 5.08 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "nRF52833_QDxx"
				(at 0 2.54 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "Package_DFN_QFN:QFN-40-1EP_5x5mm_P0.4mm_EP3.6x3.6mm"
				(at 0 -73.66 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "https://infocenter.nordicsemi.com/pdf/nRF52833_PS_v1.5.pdf"
				(at -16.51 48.26 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Multiprotocol BLE/ANT/2.4 GHz/802.15.4 Cortex-M4F SoC, QFN-40"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "MCU ARM BLE ANT 2.4GHz 802.15.4"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_fp_filters" "QFN*1EP*5x5mm*P0.4mm*"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "nRF52833_QDxx_0_1"
				(rectangle
					(start -27.94 66.04)
					(end 27.94 -66.04)
					(fill
						(type background)
					)
				)
			)
			(symbol "nRF52833_QDxx_1_1"
				(pin passive line
					(at -33.02 45.72 0)
					(length 5.08)
					(name "ANT")
					(number "24")
				)
				(pin passive line
					(at -15.24 71.12 270)
					(length 5.08)
					(name "DEC3")
					(number "27")
				)
				(pin passive line
					(at -12.7 71.12 270)
					(length 5.08)
					(name "DEC4")
					(number "38")
				)
				(pin passive line
					(at -10.16 71.12 270)
					(length 5.08)
					(name "DEC5")
					(number "21")
				)
				(pin passive line
					(at -7.62 71.12 270)
					(length 5.08)
					(name "DEC6")
					(number "26")
				)
				(pin input line
					(at -33.02 5.08 0)
					(length 5.08)
					(name "XC1")
					(number "28")
				)
				(pin input line
					(at -33.02 -5.08 0)
					(length 5.08)
					(name "XC2")
					(number "29")
				)
				(pin bidirectional line
					(at -33.02 -43.18 0)
					(length 5.08)
					(name "P0.18/~{RESET}")
					(number "16")
				)
				(pin input line
					(at -33.02 -45.72 0)
					(length 5.08)
					(name "SWDCLK")
					(number "20")
				)
				(pin bidirectional line
					(at -33.02 -48.26 0)
					(length 5.08)
					(name "SWDIO")
					(number "19")
				)
				(pin passive line
					(at -20.32 71.12 270)
					(length 5.08)
					(name "DEC1")
					(number "1")
				)
				(pin bidirectional line
					(at 33.02 -10.16 180)
					(length 5.08)
					(name "AIN6/P0.30")
					(number "35")
				)
				(pin bidirectional line
					(at 33.02 -12.7 180)
					(length 5.08)
					(name "AIN7/P0.31")
					(number "36")
				)
				(pin bidirectional line
					(at 33.02 -40.64 180)
					(length 5.08)
					(name "P1.09")
					(number "6")
				)
				(pin bidirectional line
					(at 33.02 -60.96 180)
					(length 5.08)
					(name "D-")
					(number "12")
				)
				(pin bidirectional line
					(at 33.02 -63.5 180)
					(length 5.08)
					(name "D+")
					(number "13")
				)
				(pin passive line
					(at -5.08 71.12 270)
					(length 5.08)
					(name "DECUSB")
					(number "11")
				)
				(pin passive line
					(at 0 71.12 270)
					(length 5.08)
					(hide yes)
					(name "VDD")
					(number "18")
				)
				(pin passive line
					(at 0 71.12 270)
					(length 5.08)
					(hide yes)
					(name "VDD")
					(number "30")
				)
				(pin passive line
					(at 0 71.12 270)
					(length 5.08)
					(hide yes)
					(name "VDD")
					(number "40")
				)
				(pin power_in line
					(at 0 71.12 270)
					(length 5.08)
					(name "VDD")
					(number "8")
				)
				(pin bidirectional line
					(at 33.02 50.8 180)
					(length 5.08)
					(name "AIN3/P0.05")
					(number "5")
				)
				(pin bidirectional line
					(at 33.02 40.64 180)
					(length 5.08)
					(name "NFC1/P0.09")
					(number "22")
				)
				(pin bidirectional line
					(at 33.02 38.1 180)
					(length 5.08)
					(name "NFC2/P0.10")
					(number "23")
				)
				(pin bidirectional line
					(at 33.02 35.56 180)
					(length 5.08)
					(name "P0.11")
					(number "7")
				)
				(pin power_out line
					(at 10.16 71.12 270)
					(length 5.08)
					(name "DCC")
					(number "39")
				)
				(pin bidirectional line
					(at 33.02 63.5 180)
					(length 5.08)
					(name "XL1/P0.00")
					(number "2")
				)
				(pin bidirectional line
					(at 33.02 60.96 180)
					(length 5.08)
					(name "XL2/P0.01")
					(number "3")
				)
				(pin bidirectional line
					(at 33.02 58.42 180)
					(length 5.08)
					(name "AIN0/P0.02")
					(number "32")
				)
				(pin bidirectional line
					(at 33.02 55.88 180)
					(length 5.08)
					(name "AIN1/P0.03")
					(number "31")
				)
				(pin bidirectional line
					(at 33.02 53.34 180)
					(length 5.08)
					(name "AIN2/P0.04")
					(number "4")
				)
				(pin bidirectional line
					(at 33.02 25.4 180)
					(length 5.08)
					(name "P0.15")
					(number "14")
				)
				(pin power_in line
					(at 0 -71.12 90)
					(length 5.08)
					(name "VSS")
					(number "37")
				)
				(pin passive line
					(at 0 -71.12 90)
					(length 5.08)
					(hide yes)
					(name "VSS")
					(number "41")
				)
				(pin power_in line
					(at 2.54 71.12 270)
					(length 5.08)
					(name "VDDH")
					(number "9")
				)
				(pin power_in line
					(at 2.54 -71.12 90)
					(length 5.08)
					(name "VSS_PA")
					(number "25")
				)
				(pin power_in line
					(at 5.08 71.12 270)
					(length 5.08)
					(name "VBUS")
					(number "10")
				)
				(pin bidirectional line
					(at 33.02 20.32 180)
					(length 5.08)
					(name "P0.17")
					(number "15")
				)
				(pin bidirectional line
					(at 33.02 15.24 180)
					(length 5.08)
					(name "P0.20")
					(number "17")
				)
				(pin bidirectional line
					(at 33.02 -5.08 180)
					(length 5.08)
					(name "AIN4/P0.28")
					(number "33")
				)
				(pin bidirectional line
					(at 33.02 -7.62 180)
					(length 5.08)
					(name "AIN5/P0.29")
					(number "34")
				)
			)
			(embedded_fonts no)
		)
		(symbol "PCM_SparkFun-PowerSymbol:VBATT"
			(power global)
			(pin_names
				(offset 0)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Value" "VBATT"
				(at 0 3.81 0)
				(show_name no)
				(do_not_autoplace yes)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Power symbol creates a global label with name \"VBATT\""
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "SparkFun global power"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "VBATT_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "VBATT_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(hide yes)
					(name "VBATT")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Transistor_FET:AO3401A"
			(pin_names
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "Q"
				(at 5.08 1.905 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Value" "AO3401A"
				(at 5.08 0 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
				(at 5.08 -1.905 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" "http://www.aosmd.com/pdfs/datasheet/AO3401A.pdf"
				(at 5.08 -3.81 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "-4.0A Id, -30V Vds, P-Channel MOSFET, SOT-23"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "P-Channel MOSFET"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_fp_filters" "SOT?23*"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "AO3401A_0_1"
				(polyline
					(pts
						(xy 0.254 1.905) (xy 0.254 -1.905)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.254 0) (xy -2.54 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 2.286) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 1.778) (xy 3.302 1.778) (xy 3.302 -1.778) (xy 0.762 -1.778)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 0.508) (xy 0.762 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.27) (xy 0.762 -2.286)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 1.651 0)
					(radius 2.794)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.286 0) (xy 1.27 0.381) (xy 1.27 -0.381) (xy 2.286 0)
					)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.54 2.54) (xy 2.54 1.778)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 2.54 1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(circle
					(center 2.54 -1.778)
					(radius 0.254)
					(fill
						(type outline)
					)
				)
				(polyline
					(pts
						(xy 2.54 -2.54) (xy 2.54 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.794 -0.508) (xy 2.921 -0.381) (xy 3.683 -0.381) (xy 3.81 -0.254)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 3.302 -0.381) (xy 2.921 0.254) (xy 3.683 0.254) (xy 3.302 -0.381)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "AO3401A_1_1"
				(pin input line
					(at -5.08 0 0)
					(length 2.54)
					(name "G")
					(number "1")
				)
				(pin passive line
					(at 2.54 5.08 270)
					(length 2.54)
					(name "D")
					(number "3")
				)
				(pin passive line
					(at 2.54 -5.08 90)
					(length 2.54)
					(name "S")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:+1V8"
			(power global)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Value" "+1V8"
				(at 0 3.556 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Power symbol creates a global label with name \"+1V8\""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "+1V8_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+1V8_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:GND"
			(power global)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:VBUS"
			(power global)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Value" "VBUS"
				(at 0 3.556 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Power symbol creates a global label with name \"VBUS\""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "VBUS_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "VBUS_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:VDD"
			(power global)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(in_pos_files yes)
			(duplicate_pin_numbers_are_jumpers no)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Value" "VDD"
				(at 0 3.556 0)
				(show_name no)
				(do_not_autoplace no)
			)
			(property "Footprint" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Datasheet" ""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "Description" "Power symbol creates a global label with name \"VDD\""
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
				(show_name no)
				(do_not_autoplace no)
				(hide yes)
			)
			(symbol "VDD_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "VDD_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
	)
	(rectangle
		(start 68.58 177.8)
		(end 71.12 193.04)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 312.42 228.6)
		(end 314.96 236.22)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 228.6 90.17)
		(end 400.05 215.9)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 369.57 143.51)
		(end 375.92 166.37)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 269.24 240.03)
		(end 284.48 250.19)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 62.23 229.87)
		(end 80.01 248.92)
		(fill
			(type none)
		)
	)
	(rectangle
		(start 146.05 226.06)
		(end 171.45 243.84)
		(fill
			(type none)
		)
	)
	(text "Button PCB"
		(exclude_from_sim no)
		(at 234.188 92.202 0)
	)
	(junction
		(at 273.05 120.65)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 330.2 121.92)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 114.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 292.1 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 279.4 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 82.55 227.33)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 273.05 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 287.02 242.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 64.77 83.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 213.36)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 143.51 231.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 231.14 242.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 207.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 355.6 228.6)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 330.2 132.08)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 259.08 213.36)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 33.02 266.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 118.11 236.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 54.61 266.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 35.56 224.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 91.44)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 72.39 227.33)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 330.2 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 86.36 257.81)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 279.4 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 266.7 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 312.42 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 68.58 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 337.82 195.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 374.65 168.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 367.03 195.58)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 71.12 153.67)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 304.8 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 273.05 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 292.1 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 176.53 60.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 367.03 163.83)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 80.01 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 287.02 250.19)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 273.05 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 299.72 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 367.03 184.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 368.3 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 257.81)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 368.3 228.6)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 176.53 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 330.2 110.49)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 248.92 172.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.26 166.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 330.2 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 27.94 182.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 307.34 149.86)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 367.03 168.91)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 63.5 190.5)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 254 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 368.3 241.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 302.26 120.65)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 212.09 231.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 273.05 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 119.38 55.88)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 309.88 161.29)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 340.36 204.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 71.12 166.37)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 54.61 83.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 73.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 241.3 45.72)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 273.05 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 332.74 171.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 231.14 233.68)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 38.1 199.39)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 57.15 224.79)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 106.68 53.34)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 212.09 241.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 173.99 231.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 335.28 184.15)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 64.77 99.06)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 48.26 138.43)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 245.11 242.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 367.03 207.01)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 355.6 241.3)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 83.82 266.7)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 256.54 242.57)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 241.3 76.2)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 119.38 200.66)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 367.03 171.45)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 60.96 187.96)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 187.96 50.8)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 266.7 43.18)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 304.8 40.64)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 167.64 134.62)
		(diameter 0)
		(color 0 0 0 0)
	)
	(no_connect
		(at 210.82 68.58)
	)
	(no_connect
		(at 210.82 73.66)
	)
	(no_connect
		(at 210.82 66.04)
	)
	(no_connect
		(at 59.69 247.65)
	)
	(no_connect
		(at 210.82 71.12)
	)
	(no_connect
		(at 129.54 58.42)
	)
	(no_connect
		(at 109.22 58.42)
	)
	(no_connect
		(at 287.02 245.11)
	)
	(no_connect
		(at 210.82 76.2)
	)
	(no_connect
		(at 82.55 240.03)
	)
	(wire
		(pts
			(xy 248.92 172.72) (xy 248.92 173.99)
		)
	)
	(wire
		(pts
			(xy 311.15 143.51) (xy 340.36 143.51)
		)
	)
	(wire
		(pts
			(xy 292.1 161.29) (xy 309.88 161.29)
		)
	)
	(wire
		(pts
			(xy 242.57 242.57) (xy 245.11 242.57)
		)
	)
	(wire
		(pts
			(xy 38.1 208.28) (xy 38.1 207.01)
		)
	)
	(wire
		(pts
			(xy 302.26 120.65) (xy 302.26 184.15)
		)
	)
	(wire
		(pts
			(xy 173.99 231.14) (xy 212.09 231.14)
		)
	)
	(wire
		(pts
			(xy 342.9 240.03) (xy 342.9 241.3)
		)
	)
	(wire
		(pts
			(xy 38.1 207.01) (xy 38.1 199.39)
		)
	)
	(wire
		(pts
			(xy 119.38 200.66) (xy 121.92 200.66)
		)
	)
	(wire
		(pts
			(xy 48.26 166.37) (xy 54.61 166.37)
		)
	)
	(wire
		(pts
			(xy 82.55 245.11) (xy 83.82 245.11)
		)
	)
	(wire
		(pts
			(xy 309.88 161.29) (xy 309.88 191.77)
		)
	)
	(wire
		(pts
			(xy 57.15 257.81) (xy 86.36 257.81)
		)
	)
	(wire
		(pts
			(xy 173.99 231.14) (xy 173.99 233.68)
		)
	)
	(wire
		(pts
			(xy 157.48 139.7) (xy 157.48 124.46)
		)
	)
	(wire
		(pts
			(xy 317.5 228.6) (xy 317.5 231.14)
		)
	)
	(wire
		(pts
			(xy 154.94 114.3) (xy 167.64 114.3)
		)
	)
	(wire
		(pts
			(xy 57.15 245.11) (xy 57.15 257.81)
		)
	)
	(wire
		(pts
			(xy 248.92 172.72) (xy 273.05 172.72)
		)
	)
	(wire
		(pts
			(xy 71.12 166.37) (xy 76.2 166.37)
		)
	)
	(wire
		(pts
			(xy 157.48 111.76) (xy 167.64 111.76)
		)
	)
	(wire
		(pts
			(xy 273.05 149.86) (xy 273.05 161.29)
		)
	)
	(wire
		(pts
			(xy 355.6 146.05) (xy 367.03 146.05)
		)
	)
	(wire
		(pts
			(xy 118.11 228.6) (xy 118.11 236.22)
		)
	)
	(wire
		(pts
			(xy 90.17 227.33) (xy 82.55 227.33)
		)
	)
	(wire
		(pts
			(xy 332.74 171.45) (xy 332.74 148.59)
		)
	)
	(wire
		(pts
			(xy 266.7 247.65) (xy 266.7 251.46)
		)
	)
	(wire
		(pts
			(xy 57.15 224.79) (xy 85.09 224.79)
		)
	)
	(wire
		(pts
			(xy 48.26 114.3) (xy 48.26 138.43)
		)
	)
	(wire
		(pts
			(xy 241.3 73.66) (xy 241.3 76.2)
		)
	)
	(wire
		(pts
			(xy 64.77 83.82) (xy 86.36 83.82)
		)
	)
	(wire
		(pts
			(xy 160.02 142.24) (xy 160.02 127)
		)
	)
	(wire
		(pts
			(xy 62.23 83.82) (xy 64.77 83.82)
		)
	)
	(wire
		(pts
			(xy 355.6 241.3) (xy 368.3 241.3)
		)
	)
	(wire
		(pts
			(xy 379.73 45.72) (xy 381 45.72)
		)
	)
	(wire
		(pts
			(xy 311.15 142.24) (xy 311.15 143.51)
		)
	)
	(wire
		(pts
			(xy 335.28 199.39) (xy 335.28 184.15)
		)
	)
	(wire
		(pts
			(xy 162.56 106.68) (xy 167.64 106.68)
		)
	)
	(wire
		(pts
			(xy 317.5 110.49) (xy 330.2 110.49)
		)
	)
	(wire
		(pts
			(xy 292.1 120.65) (xy 302.26 120.65)
		)
	)
	(wire
		(pts
			(xy 248.92 213.36) (xy 259.08 213.36)
		)
	)
	(wire
		(pts
			(xy 187.96 50.8) (xy 191.77 50.8)
		)
	)
	(wire
		(pts
			(xy 367.03 171.45) (xy 367.03 184.15)
		)
	)
	(wire
		(pts
			(xy 64.77 166.37) (xy 71.12 166.37)
		)
	)
	(wire
		(pts
			(xy 119.38 55.88) (xy 121.92 55.88)
		)
	)
	(wire
		(pts
			(xy 259.08 179.07) (xy 260.35 179.07)
		)
	)
	(wire
		(pts
			(xy 231.14 242.57) (xy 231.14 245.11)
		)
	)
	(wire
		(pts
			(xy 381 240.03) (xy 381 241.3)
		)
	)
	(wire
		(pts
			(xy 355.6 228.6) (xy 368.3 228.6)
		)
	)
	(wire
		(pts
			(xy 317.5 121.92) (xy 330.2 121.92)
		)
	)
	(wire
		(pts
			(xy 367.03 184.15) (xy 367.03 195.58)
		)
	)
	(wire
		(pts
			(xy 238.76 45.72) (xy 241.3 45.72)
		)
	)
	(wire
		(pts
			(xy 53.34 83.82) (xy 54.61 83.82)
		)
	)
	(wire
		(pts
			(xy 279.4 55.88) (xy 292.1 55.88)
		)
	)
	(wire
		(pts
			(xy 266.7 43.18) (xy 266.7 45.72)
		)
	)
	(wire
		(pts
			(xy 359.41 171.45) (xy 367.03 171.45)
		)
	)
	(wire
		(pts
			(xy 35.56 224.79) (xy 35.56 227.33)
		)
	)
	(wire
		(pts
			(xy 340.36 156.21) (xy 367.03 156.21)
		)
	)
	(wire
		(pts
			(xy 80.01 72.39) (xy 80.01 73.66)
		)
	)
	(wire
		(pts
			(xy 254 55.88) (xy 266.7 55.88)
		)
	)
	(wire
		(pts
			(xy 160.02 109.22) (xy 167.64 109.22)
		)
	)
	(wire
		(pts
			(xy 27.94 207.01) (xy 38.1 207.01)
		)
	)
	(wire
		(pts
			(xy 368.3 228.6) (xy 368.3 229.87)
		)
	)
	(wire
		(pts
			(xy 367.03 195.58) (xy 367.03 207.01)
		)
	)
	(wire
		(pts
			(xy 49.53 257.81) (xy 57.15 257.81)
		)
	)
	(wire
		(pts
			(xy 54.61 242.57) (xy 54.61 266.7)
		)
	)
	(wire
		(pts
			(xy 64.77 138.43) (xy 77.47 138.43)
		)
	)
	(wire
		(pts
			(xy 259.08 201.93) (xy 337.82 201.93)
		)
	)
	(wire
		(pts
			(xy 256.54 242.57) (xy 256.54 251.46)
		)
	)
	(wire
		(pts
			(xy 335.28 151.13) (xy 335.28 184.15)
		)
	)
	(wire
		(pts
			(xy 57.15 237.49) (xy 59.69 237.49)
		)
	)
	(wire
		(pts
			(xy 332.74 196.85) (xy 332.74 171.45)
		)
	)
	(wire
		(pts
			(xy 38.1 180.34) (xy 66.04 180.34)
		)
	)
	(wire
		(pts
			(xy 121.92 55.88) (xy 121.92 58.42)
		)
	)
	(wire
		(pts
			(xy 287.02 250.19) (xy 287.02 247.65)
		)
	)
	(wire
		(pts
			(xy 266.7 43.18) (xy 279.4 43.18)
		)
	)
	(wire
		(pts
			(xy 340.36 143.51) (xy 340.36 156.21)
		)
	)
	(wire
		(pts
			(xy 54.61 240.03) (xy 59.69 240.03)
		)
	)
	(wire
		(pts
			(xy 381 228.6) (xy 381 229.87)
		)
	)
	(wire
		(pts
			(xy 273.05 97.79) (xy 330.2 97.79)
		)
	)
	(wire
		(pts
			(xy 273.05 149.86) (xy 281.94 149.86)
		)
	)
	(wire
		(pts
			(xy 287.02 250.19) (xy 292.1 250.19)
		)
	)
	(wire
		(pts
			(xy 185.42 236.22) (xy 185.42 241.3)
		)
	)
	(wire
		(pts
			(xy 167.64 99.06) (xy 167.64 101.6)
		)
	)
	(wire
		(pts
			(xy 80.01 58.42) (xy 99.06 58.42)
		)
	)
	(wire
		(pts
			(xy 48.26 187.96) (xy 60.96 187.96)
		)
	)
	(wire
		(pts
			(xy 355.6 228.6) (xy 355.6 229.87)
		)
	)
	(wire
		(pts
			(xy 273.05 172.72) (xy 281.94 172.72)
		)
	)
	(wire
		(pts
			(xy 86.36 124.46) (xy 86.36 114.3)
		)
	)
	(wire
		(pts
			(xy 167.64 129.54) (xy 167.64 134.62)
		)
	)
	(wire
		(pts
			(xy 38.1 207.01) (xy 48.26 207.01)
		)
	)
	(wire
		(pts
			(xy 87.63 247.65) (xy 82.55 247.65)
		)
	)
	(wire
		(pts
			(xy 368.3 240.03) (xy 368.3 241.3)
		)
	)
	(wire
		(pts
			(xy 48.26 138.43) (xy 48.26 139.7)
		)
	)
	(wire
		(pts
			(xy 337.82 195.58) (xy 337.82 153.67)
		)
	)
	(wire
		(pts
			(xy 86.36 114.3) (xy 72.39 114.3)
		)
	)
	(wire
		(pts
			(xy 367.03 45.72) (xy 368.3 45.72)
		)
	)
	(wire
		(pts
			(xy 35.56 237.49) (xy 35.56 240.03)
		)
	)
	(wire
		(pts
			(xy 307.34 149.86) (xy 312.42 149.86)
		)
	)
	(wire
		(pts
			(xy 90.17 232.41) (xy 90.17 227.33)
		)
	)
	(wire
		(pts
			(xy 48.26 190.5) (xy 63.5 190.5)
		)
	)
	(wire
		(pts
			(xy 238.76 76.2) (xy 241.3 76.2)
		)
	)
	(wire
		(pts
			(xy 152.4 114.3) (xy 152.4 116.84)
		)
	)
	(wire
		(pts
			(xy 82.55 234.95) (xy 82.55 227.33)
		)
	)
	(wire
		(pts
			(xy 104.14 55.88) (xy 104.14 58.42)
		)
	)
	(wire
		(pts
			(xy 231.14 172.72) (xy 248.92 172.72)
		)
	)
	(wire
		(pts
			(xy 160.02 93.98) (xy 160.02 109.22)
		)
	)
	(wire
		(pts
			(xy 86.36 257.81) (xy 88.9 257.81)
		)
	)
	(wire
		(pts
			(xy 203.2 254) (xy 205.74 254)
		)
	)
	(wire
		(pts
			(xy 332.74 171.45) (xy 349.25 171.45)
		)
	)
	(wire
		(pts
			(xy 152.4 119.38) (xy 167.64 119.38)
		)
	)
	(wire
		(pts
			(xy 68.58 55.88) (xy 68.58 63.5)
		)
	)
	(wire
		(pts
			(xy 245.11 242.57) (xy 245.11 246.38)
		)
	)
	(wire
		(pts
			(xy 152.4 91.44) (xy 162.56 91.44)
		)
	)
	(wire
		(pts
			(xy 273.05 109.22) (xy 273.05 120.65)
		)
	)
	(wire
		(pts
			(xy 68.58 55.88) (xy 104.14 55.88)
		)
	)
	(wire
		(pts
			(xy 292.1 149.86) (xy 307.34 149.86)
		)
	)
	(wire
		(pts
			(xy 342.9 228.6) (xy 355.6 228.6)
		)
	)
	(wire
		(pts
			(xy 48.26 138.43) (xy 54.61 138.43)
		)
	)
	(wire
		(pts
			(xy 273.05 137.16) (xy 273.05 149.86)
		)
	)
	(wire
		(pts
			(xy 54.61 99.06) (xy 64.77 99.06)
		)
	)
	(wire
		(pts
			(xy 71.12 153.67) (xy 71.12 154.94)
		)
	)
	(wire
		(pts
			(xy 68.58 73.66) (xy 80.01 73.66)
		)
	)
	(wire
		(pts
			(xy 49.53 266.7) (xy 54.61 266.7)
		)
	)
	(wire
		(pts
			(xy 54.61 83.82) (xy 54.61 88.9)
		)
	)
	(wire
		(pts
			(xy 35.56 224.79) (xy 46.99 224.79)
		)
	)
	(wire
		(pts
			(xy 241.3 45.72) (xy 254 45.72)
		)
	)
	(wire
		(pts
			(xy 340.36 204.47) (xy 340.36 207.01)
		)
	)
	(wire
		(pts
			(xy 266.7 55.88) (xy 279.4 55.88)
		)
	)
	(wire
		(pts
			(xy 27.94 196.85) (xy 27.94 207.01)
		)
	)
	(wire
		(pts
			(xy 231.14 233.68) (xy 237.49 233.68)
		)
	)
	(wire
		(pts
			(xy 367.03 151.13) (xy 335.28 151.13)
		)
	)
	(wire
		(pts
			(xy 292.1 109.22) (xy 299.72 109.22)
		)
	)
	(wire
		(pts
			(xy 162.56 91.44) (xy 162.56 106.68)
		)
	)
	(wire
		(pts
			(xy 317.5 236.22) (xy 317.5 233.68)
		)
	)
	(wire
		(pts
			(xy 152.4 142.24) (xy 160.02 142.24)
		)
	)
	(wire
		(pts
			(xy 71.12 165.1) (xy 71.12 166.37)
		)
	)
	(wire
		(pts
			(xy 273.05 161.29) (xy 273.05 172.72)
		)
	)
	(wire
		(pts
			(xy 231.14 233.68) (xy 231.14 242.57)
		)
	)
	(wire
		(pts
			(xy 77.47 134.62) (xy 86.36 134.62)
		)
	)
	(wire
		(pts
			(xy 332.74 148.59) (xy 367.03 148.59)
		)
	)
	(wire
		(pts
			(xy 143.51 231.14) (xy 143.51 233.68)
		)
	)
	(wire
		(pts
			(xy 173.99 222.25) (xy 187.96 222.25)
		)
	)
	(wire
		(pts
			(xy 355.6 240.03) (xy 355.6 241.3)
		)
	)
	(wire
		(pts
			(xy 59.69 245.11) (xy 57.15 245.11)
		)
	)
	(wire
		(pts
			(xy 330.2 149.86) (xy 330.2 161.29)
		)
	)
	(wire
		(pts
			(xy 259.08 191.77) (xy 309.88 191.77)
		)
	)
	(wire
		(pts
			(xy 367.03 207.01) (xy 367.03 213.36)
		)
	)
	(wire
		(pts
			(xy 57.15 72.39) (xy 57.15 73.66)
		)
	)
	(wire
		(pts
			(xy 292.1 137.16) (xy 304.8 137.16)
		)
	)
	(wire
		(pts
			(xy 64.77 99.06) (xy 64.77 100.33)
		)
	)
	(wire
		(pts
			(xy 299.72 109.22) (xy 312.42 109.22)
		)
	)
	(wire
		(pts
			(xy 368.3 226.06) (xy 368.3 228.6)
		)
	)
	(wire
		(pts
			(xy 118.11 236.22) (xy 118.11 248.92)
		)
	)
	(wire
		(pts
			(xy 59.69 234.95) (xy 59.69 227.33)
		)
	)
	(wire
		(pts
			(xy 260.35 95.25) (xy 260.35 179.07)
		)
	)
	(wire
		(pts
			(xy 58.42 207.01) (xy 63.5 207.01)
		)
	)
	(wire
		(pts
			(xy 45.72 72.39) (xy 45.72 73.66)
		)
	)
	(wire
		(pts
			(xy 140.97 228.6) (xy 140.97 231.14)
		)
	)
	(wire
		(pts
			(xy 33.02 76.2) (xy 33.02 91.44)
		)
	)
	(wire
		(pts
			(xy 138.43 236.22) (xy 143.51 236.22)
		)
	)
	(wire
		(pts
			(xy 154.94 109.22) (xy 154.94 114.3)
		)
	)
	(wire
		(pts
			(xy 176.53 60.96) (xy 187.96 60.96)
		)
	)
	(wire
		(pts
			(xy 176.53 50.8) (xy 187.96 50.8)
		)
	)
	(wire
		(pts
			(xy 152.4 109.22) (xy 154.94 109.22)
		)
	)
	(wire
		(pts
			(xy 327.66 149.86) (xy 330.2 149.86)
		)
	)
	(wire
		(pts
			(xy 330.2 121.92) (xy 330.2 132.08)
		)
	)
	(wire
		(pts
			(xy 167.64 134.62) (xy 177.8 134.62)
		)
	)
	(wire
		(pts
			(xy 337.82 153.67) (xy 367.03 153.67)
		)
	)
	(wire
		(pts
			(xy 111.76 58.42) (xy 111.76 53.34)
		)
	)
	(wire
		(pts
			(xy 337.82 201.93) (xy 337.82 195.58)
		)
	)
	(wire
		(pts
			(xy 231.14 213.36) (xy 248.92 213.36)
		)
	)
	(wire
		(pts
			(xy 27.94 182.88) (xy 66.04 182.88)
		)
	)
	(wire
		(pts
			(xy 327.66 161.29) (xy 330.2 161.29)
		)
	)
	(wire
		(pts
			(xy 54.61 153.67) (xy 48.26 153.67)
		)
	)
	(wire
		(pts
			(xy 173.99 228.6) (xy 173.99 222.25)
		)
	)
	(wire
		(pts
			(xy 45.72 73.66) (xy 57.15 73.66)
		)
	)
	(wire
		(pts
			(xy 367.03 158.75) (xy 340.36 158.75)
		)
	)
	(wire
		(pts
			(xy 312.42 194.31) (xy 312.42 172.72)
		)
	)
	(wire
		(pts
			(xy 367.03 163.83) (xy 367.03 168.91)
		)
	)
	(wire
		(pts
			(xy 33.02 257.81) (xy 33.02 266.7)
		)
	)
	(wire
		(pts
			(xy 57.15 224.79) (xy 57.15 237.49)
		)
	)
	(wire
		(pts
			(xy 259.08 213.36) (xy 367.03 213.36)
		)
	)
	(wire
		(pts
			(xy 304.8 54.61) (xy 304.8 55.88)
		)
	)
	(wire
		(pts
			(xy 77.47 138.43) (xy 77.47 134.62)
		)
	)
	(wire
		(pts
			(xy 138.43 238.76) (xy 143.51 238.76)
		)
	)
	(wire
		(pts
			(xy 45.72 50.8) (xy 45.72 62.23)
		)
	)
	(wire
		(pts
			(xy 368.3 45.72) (xy 369.57 45.72)
		)
	)
	(wire
		(pts
			(xy 165.1 88.9) (xy 165.1 104.14)
		)
	)
	(wire
		(pts
			(xy 259.08 194.31) (xy 312.42 194.31)
		)
	)
	(wire
		(pts
			(xy 317.5 109.22) (xy 317.5 110.49)
		)
	)
	(wire
		(pts
			(xy 114.3 50.8) (xy 114.3 58.42)
		)
	)
	(wire
		(pts
			(xy 85.09 237.49) (xy 85.09 224.79)
		)
	)
	(wire
		(pts
			(xy 80.01 58.42) (xy 80.01 62.23)
		)
	)
	(wire
		(pts
			(xy 287.02 256.54) (xy 287.02 250.19)
		)
	)
	(wire
		(pts
			(xy 154.94 121.92) (xy 167.64 121.92)
		)
	)
	(wire
		(pts
			(xy 317.5 120.65) (xy 317.5 121.92)
		)
	)
	(wire
		(pts
			(xy 292.1 172.72) (xy 312.42 172.72)
		)
	)
	(wire
		(pts
			(xy 330.2 48.26) (xy 330.2 50.8)
		)
	)
	(wire
		(pts
			(xy 292.1 40.64) (xy 292.1 45.72)
		)
	)
	(wire
		(pts
			(xy 195.58 241.3) (xy 212.09 241.3)
		)
	)
	(wire
		(pts
			(xy 327.66 132.08) (xy 330.2 132.08)
		)
	)
	(wire
		(pts
			(xy 53.34 199.39) (xy 60.96 199.39)
		)
	)
	(wire
		(pts
			(xy 124.46 44.45) (xy 124.46 58.42)
		)
	)
	(wire
		(pts
			(xy 38.1 76.2) (xy 33.02 76.2)
		)
	)
	(wire
		(pts
			(xy 157.48 124.46) (xy 167.64 124.46)
		)
	)
	(wire
		(pts
			(xy 138.43 248.92) (xy 138.43 238.76)
		)
	)
	(wire
		(pts
			(xy 63.5 190.5) (xy 66.04 190.5)
		)
	)
	(wire
		(pts
			(xy 59.69 227.33) (xy 72.39 227.33)
		)
	)
	(wire
		(pts
			(xy 355.6 95.25) (xy 355.6 146.05)
		)
	)
	(wire
		(pts
			(xy 86.36 242.57) (xy 86.36 257.81)
		)
	)
	(wire
		(pts
			(xy 302.26 120.65) (xy 312.42 120.65)
		)
	)
	(wire
		(pts
			(xy 173.99 236.22) (xy 185.42 236.22)
		)
	)
	(wire
		(pts
			(xy 342.9 241.3) (xy 355.6 241.3)
		)
	)
	(wire
		(pts
			(xy 83.82 266.7) (xy 88.9 266.7)
		)
	)
	(wire
		(pts
			(xy 259.08 196.85) (xy 332.74 196.85)
		)
	)
	(wire
		(pts
			(xy 304.8 38.1) (xy 304.8 40.64)
		)
	)
	(wire
		(pts
			(xy 72.39 114.3) (xy 72.39 116.84)
		)
	)
	(wire
		(pts
			(xy 38.1 199.39) (xy 43.18 199.39)
		)
	)
	(wire
		(pts
			(xy 245.11 242.57) (xy 256.54 242.57)
		)
	)
	(wire
		(pts
			(xy 157.48 104.14) (xy 157.48 111.76)
		)
	)
	(wire
		(pts
			(xy 273.05 109.22) (xy 281.94 109.22)
		)
	)
	(wire
		(pts
			(xy 337.82 195.58) (xy 349.25 195.58)
		)
	)
	(wire
		(pts
			(xy 397.51 168.91) (xy 397.51 140.97)
		)
	)
	(wire
		(pts
			(xy 359.41 195.58) (xy 367.03 195.58)
		)
	)
	(wire
		(pts
			(xy 45.72 50.8) (xy 114.3 50.8)
		)
	)
	(wire
		(pts
			(xy 340.36 158.75) (xy 340.36 204.47)
		)
	)
	(wire
		(pts
			(xy 304.8 137.16) (xy 307.34 137.16)
		)
	)
	(wire
		(pts
			(xy 309.88 161.29) (xy 312.42 161.29)
		)
	)
	(wire
		(pts
			(xy 119.38 55.88) (xy 119.38 58.42)
		)
	)
	(wire
		(pts
			(xy 101.6 247.65) (xy 97.79 247.65)
		)
	)
	(wire
		(pts
			(xy 256.54 242.57) (xy 266.7 242.57)
		)
	)
	(wire
		(pts
			(xy 259.08 204.47) (xy 340.36 204.47)
		)
	)
	(wire
		(pts
			(xy 106.68 53.34) (xy 111.76 53.34)
		)
	)
	(wire
		(pts
			(xy 231.14 228.6) (xy 231.14 233.68)
		)
	)
	(wire
		(pts
			(xy 397.51 140.97) (xy 374.65 140.97)
		)
	)
	(wire
		(pts
			(xy 38.1 185.42) (xy 66.04 185.42)
		)
	)
	(wire
		(pts
			(xy 238.76 40.64) (xy 292.1 40.64)
		)
	)
	(wire
		(pts
			(xy 273.05 120.65) (xy 281.94 120.65)
		)
	)
	(wire
		(pts
			(xy 60.96 187.96) (xy 66.04 187.96)
		)
	)
	(wire
		(pts
			(xy 259.08 207.01) (xy 259.08 213.36)
		)
	)
	(wire
		(pts
			(xy 82.55 242.57) (xy 86.36 242.57)
		)
	)
	(wire
		(pts
			(xy 245.11 242.57) (xy 245.11 238.76)
		)
	)
	(wire
		(pts
			(xy 248.92 212.09) (xy 248.92 213.36)
		)
	)
	(wire
		(pts
			(xy 140.97 231.14) (xy 143.51 231.14)
		)
	)
	(wire
		(pts
			(xy 330.2 97.79) (xy 330.2 110.49)
		)
	)
	(wire
		(pts
			(xy 25.4 182.88) (xy 27.94 182.88)
		)
	)
	(wire
		(pts
			(xy 182.88 238.76) (xy 182.88 254)
		)
	)
	(wire
		(pts
			(xy 33.02 266.7) (xy 39.37 266.7)
		)
	)
	(wire
		(pts
			(xy 359.41 207.01) (xy 367.03 207.01)
		)
	)
	(wire
		(pts
			(xy 259.08 186.69) (xy 304.8 186.69)
		)
	)
	(wire
		(pts
			(xy 340.36 207.01) (xy 349.25 207.01)
		)
	)
	(wire
		(pts
			(xy 152.4 104.14) (xy 157.48 104.14)
		)
	)
	(wire
		(pts
			(xy 38.1 199.39) (xy 38.1 185.42)
		)
	)
	(wire
		(pts
			(xy 304.8 55.88) (xy 292.1 55.88)
		)
	)
	(wire
		(pts
			(xy 273.05 161.29) (xy 281.94 161.29)
		)
	)
	(wire
		(pts
			(xy 367.03 161.29) (xy 367.03 163.83)
		)
	)
	(wire
		(pts
			(xy 48.26 153.67) (xy 48.26 166.37)
		)
	)
	(wire
		(pts
			(xy 287.02 228.6) (xy 287.02 242.57)
		)
	)
	(wire
		(pts
			(xy 279.4 43.18) (xy 279.4 46.99)
		)
	)
	(wire
		(pts
			(xy 152.4 139.7) (xy 157.48 139.7)
		)
	)
	(wire
		(pts
			(xy 152.4 88.9) (xy 165.1 88.9)
		)
	)
	(wire
		(pts
			(xy 64.77 93.98) (xy 64.77 99.06)
		)
	)
	(wire
		(pts
			(xy 330.2 110.49) (xy 330.2 121.92)
		)
	)
	(wire
		(pts
			(xy 201.93 50.8) (xy 210.82 50.8)
		)
	)
	(wire
		(pts
			(xy 260.35 95.25) (xy 355.6 95.25)
		)
	)
	(wire
		(pts
			(xy 273.05 137.16) (xy 281.94 137.16)
		)
	)
	(wire
		(pts
			(xy 152.4 137.16) (xy 154.94 137.16)
		)
	)
	(wire
		(pts
			(xy 259.08 199.39) (xy 335.28 199.39)
		)
	)
	(wire
		(pts
			(xy 368.3 38.1) (xy 368.3 45.72)
		)
	)
	(wire
		(pts
			(xy 119.38 44.45) (xy 119.38 55.88)
		)
	)
	(wire
		(pts
			(xy 63.5 207.01) (xy 63.5 190.5)
		)
	)
	(wire
		(pts
			(xy 245.11 254) (xy 245.11 256.54)
		)
	)
	(wire
		(pts
			(xy 238.76 43.18) (xy 266.7 43.18)
		)
	)
	(wire
		(pts
			(xy 77.47 115.57) (xy 82.55 115.57)
		)
	)
	(wire
		(pts
			(xy 64.77 153.67) (xy 71.12 153.67)
		)
	)
	(wire
		(pts
			(xy 330.2 172.72) (xy 330.2 161.29)
		)
	)
	(wire
		(pts
			(xy 152.4 93.98) (xy 160.02 93.98)
		)
	)
	(wire
		(pts
			(xy 238.76 73.66) (xy 241.3 73.66)
		)
	)
	(wire
		(pts
			(xy 68.58 71.12) (xy 68.58 73.66)
		)
	)
	(wire
		(pts
			(xy 359.41 184.15) (xy 367.03 184.15)
		)
	)
	(wire
		(pts
			(xy 82.55 227.33) (xy 72.39 227.33)
		)
	)
	(wire
		(pts
			(xy 231.14 255.27) (xy 231.14 256.54)
		)
	)
	(wire
		(pts
			(xy 205.74 254) (xy 205.74 250.19)
		)
	)
	(wire
		(pts
			(xy 173.99 238.76) (xy 182.88 238.76)
		)
	)
	(wire
		(pts
			(xy 71.12 153.67) (xy 76.2 153.67)
		)
	)
	(wire
		(pts
			(xy 77.47 134.62) (xy 77.47 132.08)
		)
	)
	(wire
		(pts
			(xy 64.77 114.3) (xy 72.39 114.3)
		)
	)
	(wire
		(pts
			(xy 311.15 132.08) (xy 312.42 132.08)
		)
	)
	(wire
		(pts
			(xy 80.01 73.66) (xy 80.01 74.93)
		)
	)
	(wire
		(pts
			(xy 368.3 241.3) (xy 368.3 243.84)
		)
	)
	(wire
		(pts
			(xy 273.05 97.79) (xy 273.05 109.22)
		)
	)
	(wire
		(pts
			(xy 259.08 181.61) (xy 299.72 181.61)
		)
	)
	(wire
		(pts
			(xy 259.08 184.15) (xy 302.26 184.15)
		)
	)
	(wire
		(pts
			(xy 160.02 127) (xy 167.64 127)
		)
	)
	(wire
		(pts
			(xy 152.4 134.62) (xy 152.4 119.38)
		)
	)
	(wire
		(pts
			(xy 355.6 45.72) (xy 356.87 45.72)
		)
	)
	(wire
		(pts
			(xy 273.05 120.65) (xy 273.05 137.16)
		)
	)
	(wire
		(pts
			(xy 279.4 54.61) (xy 279.4 55.88)
		)
	)
	(wire
		(pts
			(xy 33.02 91.44) (xy 38.1 91.44)
		)
	)
	(wire
		(pts
			(xy 327.66 172.72) (xy 330.2 172.72)
		)
	)
	(wire
		(pts
			(xy 335.28 184.15) (xy 349.25 184.15)
		)
	)
	(wire
		(pts
			(xy 77.47 115.57) (xy 77.47 116.84)
		)
	)
	(wire
		(pts
			(xy 39.37 257.81) (xy 33.02 257.81)
		)
	)
	(wire
		(pts
			(xy 57.15 53.34) (xy 57.15 62.23)
		)
	)
	(wire
		(pts
			(xy 330.2 132.08) (xy 330.2 149.86)
		)
	)
	(wire
		(pts
			(xy 27.94 182.88) (xy 27.94 186.69)
		)
	)
	(wire
		(pts
			(xy 154.94 137.16) (xy 154.94 121.92)
		)
	)
	(wire
		(pts
			(xy 57.15 73.66) (xy 68.58 73.66)
		)
	)
	(wire
		(pts
			(xy 152.4 116.84) (xy 167.64 116.84)
		)
	)
	(wire
		(pts
			(xy 304.8 40.64) (xy 304.8 46.99)
		)
	)
	(wire
		(pts
			(xy 57.15 53.34) (xy 106.68 53.34)
		)
	)
	(wire
		(pts
			(xy 143.51 241.3) (xy 140.97 241.3)
		)
	)
	(wire
		(pts
			(xy 342.9 229.87) (xy 342.9 228.6)
		)
	)
	(wire
		(pts
			(xy 367.03 168.91) (xy 367.03 171.45)
		)
	)
	(wire
		(pts
			(xy 60.96 199.39) (xy 60.96 187.96)
		)
	)
	(wire
		(pts
			(xy 368.3 241.3) (xy 381 241.3)
		)
	)
	(wire
		(pts
			(xy 82.55 237.49) (xy 85.09 237.49)
		)
	)
	(wire
		(pts
			(xy 355.6 38.1) (xy 355.6 45.72)
		)
	)
	(wire
		(pts
			(xy 259.08 189.23) (xy 307.34 189.23)
		)
	)
	(wire
		(pts
			(xy 165.1 104.14) (xy 167.64 104.14)
		)
	)
	(wire
		(pts
			(xy 287.02 242.57) (xy 292.1 242.57)
		)
	)
	(wire
		(pts
			(xy 307.34 149.86) (xy 307.34 189.23)
		)
	)
	(wire
		(pts
			(xy 54.61 266.7) (xy 83.82 266.7)
		)
	)
	(wire
		(pts
			(xy 304.8 137.16) (xy 304.8 186.69)
		)
	)
	(wire
		(pts
			(xy 83.82 245.11) (xy 83.82 266.7)
		)
	)
	(wire
		(pts
			(xy 279.4 38.1) (xy 279.4 43.18)
		)
	)
	(wire
		(pts
			(xy 48.26 114.3) (xy 54.61 114.3)
		)
	)
	(wire
		(pts
			(xy 368.3 228.6) (xy 381 228.6)
		)
	)
	(wire
		(pts
			(xy 241.3 55.88) (xy 254 55.88)
		)
	)
	(wire
		(pts
			(xy 231.14 242.57) (xy 232.41 242.57)
		)
	)
	(wire
		(pts
			(xy 299.72 109.22) (xy 299.72 181.61)
		)
	)
	(wire
		(pts
			(xy 119.38 200.66) (xy 119.38 201.93)
		)
	)
	(wire
		(pts
			(xy 106.68 53.34) (xy 106.68 58.42)
		)
	)
	(wire
		(pts
			(xy 59.69 242.57) (xy 54.61 242.57)
		)
	)
	(wire
		(pts
			(xy 292.1 40.64) (xy 304.8 40.64)
		)
	)
	(wire
		(pts
			(xy 177.8 96.52) (xy 182.88 96.52)
		)
	)
	(wire
		(pts
			(xy 231.14 213.36) (xy 231.14 172.72)
		)
	)
	(wire
		(pts
			(xy 140.97 241.3) (xy 140.97 251.46)
		)
	)
	(wire
		(pts
			(xy 374.65 168.91) (xy 397.51 168.91)
		)
	)
	(wire
		(pts
			(xy 367.03 168.91) (xy 374.65 168.91)
		)
	)
	(label "PMW_LED"
		(at 86.36 172.72 180)
	)
	(label "D+"
		(at 99.06 266.7 0)
	)
	(label "PMW_MOTION"
		(at 152.4 78.74 0)
	)
	(label "PMW_~{RESET}"
		(at 152.4 170.18 0)
	)
	(label "DC+"
		(at 68.58 266.7 0)
	)
	(label "PMW_SCLK"
		(at 210.82 58.42 180)
	)
	(label "PMW_MOSI"
		(at 210.82 40.64 180)
	)
	(label "XL1"
		(at 76.2 153.67 0)
	)
	(label "D-"
		(at 99.06 257.81 0)
	)
	(label "PMW_MISO"
		(at 210.82 53.34 180)
	)
	(label "SWDIO"
		(at 86.36 177.8 180)
	)
	(label "D+"
		(at 152.4 193.04 0)
	)
	(label "PMW_LED"
		(at 176.53 40.64 180)
	)
	(label "XL2"
		(at 152.4 68.58 0)
	)
	(label "DC-"
		(at 68.58 257.81 0)
	)
	(label "XL1"
		(at 152.4 66.04 0)
	)
	(label "D-"
		(at 152.4 190.5 0)
	)
	(label "SWDIO"
		(at 48.26 187.96 180)
	)
	(label "XL2"
		(at 76.2 166.37 0)
	)
	(label "PMW_MISO"
		(at 330.2 50.8 180)
	)
	(label "SWDCLK"
		(at 86.36 175.26 180)
	)
	(label "PMW_MOSI"
		(at 152.4 73.66 0)
	)
	(label "BtnPCB_GND"
		(at 367.03 213.36 0)
	)
	(label "PMW_MOTION"
		(at 210.82 43.18 180)
	)
	(label "PMW_MISO"
		(at 152.4 76.2 0)
	)
	(label "BtnPCB_VCC"
		(at 355.6 95.25 0)
	)
	(label "PMW_~{RESET}"
		(at 210.82 55.88 180)
	)
	(label "SWDCLK"
		(at 25.4 182.88 180)
	)
	(label "~{RESET}"
		(at 48.26 190.5 180)
	)
	(label "PMW_SCLK"
		(at 152.4 71.12 0)
	)
	(symbol
		(lib_id "EasyEDA:WR04X222JTL")
		(at 368.3 44.45 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R17"
			(at 374.65 39.37 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "2.2kΩ"
			(at 374.65 41.91 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 368.3 53.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount_2-2KR-222-5_C168260.html"
			(at 368.3 55.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 368.3 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C168260"
			(at 368.3 58.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Walsin"
			(at 368.3 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "WR04X222JTL"
			(at 368.3 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 368.3 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C168260.html"
			(at 368.3 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PAW3395DM-T6QU_C41346211")
		(at 209.55 38.1 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "U8"
			(at 224.79 33.02 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PAW3395DM-T6QU_C41346211"
			(at 224.79 35.56 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:PDIP-16_L16.2-W9.1-P1.78-TL_PMW3389DM-T3QU"
			(at 209.55 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C41346211.pdf"
			(at 209.55 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Optical mouse sensor"
			(at 209.55 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C41346211"
			(at 209.55 86.36 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "PixArt"
			(at 209.55 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PAW3395DM-T6QU"
			(at 209.55 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DIP-16"
			(at 209.55 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C41346211.html"
			(at 209.55 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "3")
		(pin "4")
		(pin "7")
		(pin "8")
		(pin "6")
		(pin "2")
		(pin "16")
		(pin "11")
		(pin "13")
		(pin "5")
		(pin "15")
		(pin "12")
		(pin "9")
		(pin "14")
		(pin "10")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 44.45 240.03 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR016"
			(at 44.45 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 44.45 245.11 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 44.45 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 44.45 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 44.45 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR016")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VBUS")
		(at 35.56 224.79 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 35.56 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBUS"
			(at 35.56 219.71 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 35.56 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 35.56 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBUS\""
			(at 35.56 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 173.99 251.46 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR039"
			(at 173.99 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 173.99 256.54 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 173.99 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 173.99 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 173.99 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR039")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:FPC11-X1.0-8AH2.5")
		(at 372.11 156.21 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U5"
			(at 375.92 153.6699 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "FPC11-X1.0-8AH2.5"
			(at 375.92 156.2099 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:FPC-SMD_8P-P1.00_XYECONN_FPC10-S1.0-8AH2.5"
			(at 372.11 176.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C19269896.pdf"
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "FFC connector"
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19269896"
			(at 372.11 179.07 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "XYECONN"
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "FPC11-X1.0-8AH2.5"
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SMD,P=1mm,Surface Mount,Right Angle"
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19269896.html"
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 372.11 156.21 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "10")
		(pin "3")
		(pin "8")
		(pin "9")
		(pin "7")
		(pin "4")
		(pin "5")
		(pin "6")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 72.39 132.08 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR040"
			(at 72.39 138.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 72.39 137.16 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 72.39 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 72.39 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 72.39 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR040")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:RCA025K1JLF")
		(at 92.71 247.65 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R2"
			(at 92.71 241.3 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "5.1kΩ"
			(at 92.71 243.84 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 92.71 255.27 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C2906874.pdf"
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2906874"
			(at 92.71 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "FRC0402F5101TS"
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FOJAN"
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2906874.html"
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 92.71 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 38.1 180.34 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR010"
			(at 38.1 184.15 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 38.1 175.26 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 38.1 180.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 38.1 180.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 38.1 180.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 212.09 241.3 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR029"
			(at 212.09 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 212.09 246.38 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 212.09 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 212.09 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 212.09 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR029")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 287.02 228.6 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR030"
			(at 287.02 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 287.02 223.52 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 287.02 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 287.02 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 287.02 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR030")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:WR04X222JTL")
		(at 175.26 62.23 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R19"
			(at 178.435 54.6099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "2.2kΩ"
			(at 178.435 57.1499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 184.15 62.23 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount_2-2KR-222-5_C168260.html"
			(at 186.69 62.23 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 175.26 62.23 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C168260"
			(at 189.23 62.23 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Walsin"
			(at 175.26 62.23 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "WR04X222JTL"
			(at 175.26 62.23 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 175.26 62.23 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C168260.html"
			(at 175.26 62.23 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 287.02 256.54 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR033"
			(at 287.02 262.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 287.02 261.62 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 287.02 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 287.02 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 287.02 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR033")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 33.02 266.7 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR042"
			(at 33.02 273.05 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 33.02 271.78 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 33.02 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 33.02 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 33.02 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR042")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:D2F-01")
		(at 320.04 172.72 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "SW6"
			(at 320.04 163.83 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "D2F-01"
			(at 320.04 166.37 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SW-TH_D2F-01"
			(at 320.04 180.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Microswitches_Omron-Electronics-D2F-01_C397278.html"
			(at 320.04 182.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Microswitch"
			(at 320.04 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C397278"
			(at 320.04 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "OMRON"
			(at 320.04 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "D2F-01"
			(at 320.04 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole"
			(at 320.04 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C397278.html"
			(at 320.04 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 320.04 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "SW6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05B104KO5NNNC")
		(at 355.6 234.95 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C4"
			(at 359.41 231.1399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "0.1µF"
			(at 359.41 233.6799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 347.98 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05B104KO5NNNC_100nF-104-10-16V_C1525.html"
			(at 345.44 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 355.6 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-25565"
			(at 339.09 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 359.41 236.2199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 359.41 238.7599 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C1525"
			(at 342.9 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 355.6 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05B104KO5NNNC"
			(at 355.6 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 355.6 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C1525.html"
			(at 355.6 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 355.6 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 80.01 74.93 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07"
			(at 80.01 81.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 80.01 80.01 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 80.01 74.93 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 80.01 74.93 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 80.01 74.93 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF1003T5E")
		(at 231.14 250.19 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R6"
			(at 233.68 248.9199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "100kΩ"
			(at 233.68 251.4599 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 223.52 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_100KR-1003-1_C25803.html"
			(at 220.98 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 231.14 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C25803"
			(at 218.44 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 231.14 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF1003T5E"
			(at 231.14 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 231.14 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C25803.html"
			(at 231.14 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 231.14 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 354.33 184.15 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D11"
			(at 354.965 177.8 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 354.965 180.34 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 354.33 191.77 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 354.33 194.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 354.33 184.15 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 354.33 196.85 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 354.33 184.15 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 354.33 184.15 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 354.33 184.15 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:TCC0402COG1R2C500AT")
		(at 57.15 88.9 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "C9"
			(at 57.404 92.202 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.2pF"
			(at 57.404 94.742 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 46.99 88.9 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C22374839.pdf"
			(at 57.15 88.9 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 57.15 88.9 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C880658"
			(at 44.45 88.9 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CGA0201C0G1R2C500ET"
			(at 57.404 97.5361 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HRE"
			(at 57.15 88.9 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0201"
			(at 57.15 88.9 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22374839.html"
			(at 57.15 88.9 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 57.15 88.9 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:A-IPEX1-1.25A")
		(at 40.64 83.82 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "RF1"
			(at 34.29 82.5499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "A-IPEX1-1.25A"
			(at 34.29 85.0899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:IPEX-SMD_3P-L2.6-W2.6-LS3.0_RF1200001R"
			(at 30.48 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C22467595.pdf"
			(at 40.64 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "IPEX antenna connector"
			(at 40.64 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22467595"
			(at 27.94 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "MyAntenna"
			(at 40.64 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "A-IPEX1-1.25A"
			(at 40.64 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SMD"
			(at 40.64 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22467595.html"
			(at 40.64 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 40.64 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "RF1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:RCA025K1JLF")
		(at 49.53 240.03 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R3"
			(at 49.53 233.68 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "5.1kΩ"
			(at 49.53 236.22 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 49.53 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C2906874.pdf"
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2906874"
			(at 49.53 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "FRC0402F5101TS"
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FOJAN"
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2906874.html"
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 49.53 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 241.3 76.2 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR045"
			(at 241.3 82.55 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 241.3 81.28 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 241.3 76.2 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 241.3 76.2 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 241.3 76.2 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR045")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A105KA5NQNC")
		(at 368.3 234.95 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C3"
			(at 372.11 231.1399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.0µF"
			(at 372.11 233.6799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 360.68 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A105KA5NQNC_1uF-105-10-25V_C52923.html"
			(at 358.14 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 368.3 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14969"
			(at 351.79 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 372.11 236.2199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 372.11 238.7599 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C52923"
			(at 355.6 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 368.3 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A105KA5NQNC"
			(at 368.3 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 368.3 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C52923.html"
			(at 368.3 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 368.3 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 58.42 83.82 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "L1"
			(at 58.42 78.74 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "4.7nH"
			(at 58.42 81.28 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:L0402"
			(at 58.42 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C395070.pdf"
			(at 58.42 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Inductor"
			(at 58.42 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C395070"
			(at 58.42 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 58.42 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "VHF100505HQ4N7ST"
			(at 58.42 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 58.42 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C395070.html"
			(at 58.42 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 58.42 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "L1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 167.64 134.62 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR020"
			(at 167.64 140.97 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 167.64 139.7 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 167.64 134.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 167.64 134.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 167.64 134.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR020")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 354.33 171.45 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D10"
			(at 354.965 165.1 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 354.965 167.64 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 354.33 179.07 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 354.33 181.61 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 354.33 171.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 354.33 184.15 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 354.33 171.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 354.33 171.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 354.33 171.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0402WGF1002TCE")
		(at 330.2 43.18 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R14"
			(at 332.74 41.9099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "10kΩ"
			(at 332.74 44.4499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 337.82 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_10KR-1002-1_C25744.html"
			(at 340.36 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 330.2 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C25744"
			(at 342.9 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 330.2 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0402WGF1002TCE"
			(at 330.2 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 330.2 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C25744.html"
			(at 330.2 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 330.2 43.18 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 317.5 236.22 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR024"
			(at 317.5 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 317.5 241.3 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 317.5 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 317.5 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 317.5 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR024")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:RTT02220JTH")
		(at 87.63 256.54 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R12"
			(at 93.98 251.46 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "22Ω"
			(at 93.98 254 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount_22R-220-5_C102894.html"
			(at 87.63 267.97 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 87.63 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C102894"
			(at 87.63 270.51 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "LIZ"
			(at 87.63 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CR0402JF0220G"
			(at 87.63 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 87.63 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C100612.html"
			(at 87.63 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 87.63 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 368.3 226.06 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 368.3 229.87 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 368.3 220.98 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 368.3 226.06 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 368.3 226.06 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 368.3 226.06 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Transistor_FET:AO3401A")
		(at 242.57 233.68 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Q1"
			(at 248.92 232.4099 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "AO3401-ED"
			(at 248.92 234.9499 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "Package_TO_SOT_SMD:SOT-23"
			(at 247.65 235.585 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://jlcpcb.com/api/file/downloadByFileSystemAccessId/8589836291778387968"
			(at 247.65 237.49 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "-4.0A Id, -30V Vds, P-Channel MOSFET, SOT-23"
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C4748724"
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HXY MOSFET"
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "AO3401-ED"
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SOT-23"
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C4748724.html"
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 242.57 233.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "3")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "Q1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 48.26 166.37 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR017"
			(at 48.26 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 48.26 171.45 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 48.26 166.37 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 48.26 166.37 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 48.26 166.37 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR017")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VBUS")
		(at 124.46 44.45 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 124.46 48.26 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBUS"
			(at 124.46 39.37 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 124.46 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 124.46 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBUS\""
			(at 124.46 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05B104KO5NNNC")
		(at 80.01 67.31 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C5"
			(at 83.82 63.4999 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "0.1µF"
			(at 83.82 66.0399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 72.39 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05B104KO5NNNC_100nF-104-10-16V_C1525.html"
			(at 69.85 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 80.01 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-25565"
			(at 63.5 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 83.82 68.5799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 83.82 71.1199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C1525"
			(at 67.31 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 80.01 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05B104KO5NNNC"
			(at 80.01 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 80.01 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C1525.html"
			(at 80.01 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 80.01 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CSA0402C0G120J500GT")
		(at 54.61 163.83 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "C14"
			(at 59.944 159.512 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "12pF"
			(at 59.944 162.052 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 54.61 173.99 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_12pF-120-5-50V_C50391.html"
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C18220923"
			(at 54.61 176.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0201CG120J500NT"
			(at 59.944 169.164 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0201"
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C50391.html"
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 38.1 208.28 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR011"
			(at 38.1 214.63 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 38.1 213.36 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 38.1 208.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 38.1 208.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 38.1 208.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05B104KO5NNNC")
		(at 266.7 50.8 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C21"
			(at 270.51 46.9899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "0.1µF"
			(at 270.51 49.5299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 259.08 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05B104KO5NNNC_100nF-104-10-16V_C1525.html"
			(at 256.54 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 266.7 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-25565"
			(at 250.19 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 270.51 52.0699 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 270.51 54.6099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C1525"
			(at 254 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 266.7 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05B104KO5NNNC"
			(at 266.7 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 266.7 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C1525.html"
			(at 266.7 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 266.7 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C21")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 35.56 240.03 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 35.56 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 35.56 245.11 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 35.56 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 35.56 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 35.56 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 119.38 44.45 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR09"
			(at 119.38 48.26 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 119.38 39.37 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 119.38 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 119.38 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 119.38 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 64.77 100.33 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08"
			(at 64.77 106.68 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 64.77 105.41 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 64.77 100.33 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 64.77 100.33 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 64.77 100.33 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:HCZZ0001-12")
		(at 166.37 95.25 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "CN5"
			(at 180.34 114.2999 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "HCZZ0001-12"
			(at 180.34 116.8399 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:CONN-SMD_HCZZ0001-12"
			(at 166.37 142.24 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C7433463.pdf"
			(at 166.37 95.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Connector Header 12 position 1.25mm Pitch 1A Surface Mount, Right Angle -25℃~+70℃"
			(at 166.37 95.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C7433463"
			(at 166.37 144.78 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Hong Cheng"
			(at 166.37 95.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "HCZZ0001-12"
			(at 166.37 95.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C7433463.html"
			(at 166.37 95.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "12")
		(pin "13")
		(pin "6")
		(pin "1")
		(pin "3")
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "9")
		(pin "11")
		(pin "10")
		(pin "7")
		(pin "14")
		(pin "8")
		(instances
			(project ""
				(path
					(reference "CN5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:TCC0402COG1R2C500AT")
		(at 67.31 83.82 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "C10"
			(at 67.564 87.122 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.2pF"
			(at 67.564 89.662 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 57.15 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C22374839.pdf"
			(at 67.31 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 67.31 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C880658"
			(at 54.61 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CGA0201C0G1R2C500ET"
			(at 67.564 92.4561 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HRE"
			(at 67.31 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0201"
			(at 67.31 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22374839.html"
			(at 67.31 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 67.31 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 82.55 115.57 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR041"
			(at 82.55 121.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 82.55 120.65 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 82.55 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 82.55 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 82.55 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR041")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:MBR0540_C22378362")
		(at 237.49 242.57 0)
		(mirror y)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D1"
			(at 237.87 236.22 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "MBR0540"
			(at 237.87 238.76 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-123FL_L2.7-W1.8-LS3.8-RD"
			(at 237.49 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C22378362.pdf"
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Schottky diode"
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22378362"
			(at 237.49 252.73 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "DOWO"
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "MBR0540"
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SOD-123"
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22378362.html"
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 237.49 242.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:AC0402JR-075R6L")
		(at 191.77 49.53 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R15"
			(at 196.85 44.45 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "5.6Ω"
			(at 196.85 46.99 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 191.77 58.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Others_YAGEO-AC0402JR-075R6L_C227401.html"
			(at 191.77 60.96 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 191.77 49.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C227401"
			(at 191.77 63.5 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "AC0402JR-075R6L"
			(at 191.77 49.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "YAGEO"
			(at 191.77 49.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 191.77 49.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C227401.html"
			(at 191.77 49.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:MCP73833-AMI_MF")
		(at 158.75 236.22 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U9"
			(at 158.75 220.98 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "MCP73833-AMI/MF"
			(at 158.75 223.52 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:DFN-10_L3.0-W3.0-P0.50-BL-EP-1"
			(at 158.75 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C635264.pdf"
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Li-Ion / Li-Polymer Charge Management Controller"
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C635264"
			(at 158.75 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "MICROCHIP"
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "MCP73833-AMI/MF"
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DFN-10-EP"
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C635264.html"
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 158.75 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "4")
		(pin "9")
		(pin "10")
		(pin "8")
		(pin "2")
		(pin "7")
		(pin "5")
		(pin "6")
		(pin "11")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "U9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF1500T5E")
		(at 133.35 236.22 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R5"
			(at 133.35 229.87 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "150Ω"
			(at 133.35 232.41 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 133.35 243.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_150R-1500-1_C22808.html"
			(at 133.35 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 133.35 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22808"
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 133.35 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF1500T5E"
			(at 133.35 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 133.35 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22808.html"
			(at 133.35 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 133.35 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 119.38 201.93 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 119.38 208.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 119.38 207.01 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 119.38 201.93 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 119.38 201.93 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 119.38 201.93 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 53.34 207.01 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D15"
			(at 53.975 200.66 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 53.975 203.2 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 53.34 214.63 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 53.34 217.17 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 53.34 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 53.34 219.71 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 0 0 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 0 0 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 53.34 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 53.34 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 53.34 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:HC-PH-2AW-TW")
		(at 312.42 232.41 180)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "U6"
			(at 314.135 226.06 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "HC-PH-2AW-TW"
			(at 314.135 228.6 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:HDR-TH_2P-P2.00-H-F-W6.0"
			(at 312.42 223.52 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C19273675.pdf"
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Battery connector"
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19273675"
			(at 312.42 220.98 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Hong Cheng"
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "HC-PH-2AW-TW"
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole,Right Angle,P=2mm"
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19273675.html"
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 312.42 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "PCM_SparkFun-PowerSymbol:VBATT")
		(at 212.09 231.14 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR036"
			(at 212.09 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBATT"
			(at 212.09 227.33 0)
			(show_name no)
			(do_not_autoplace yes)
		)
		(property "Footprint" ""
			(at 212.09 231.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 212.09 231.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBATT\""
			(at 212.09 237.49 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR036")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "PCM_SparkFun-PowerSymbol:VBATT")
		(at 245.11 228.6 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR031"
			(at 245.11 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBATT"
			(at 245.11 224.79 0)
			(show_name no)
			(do_not_autoplace yes)
		)
		(property "Footprint" ""
			(at 245.11 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 245.11 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBATT\""
			(at 245.11 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR031")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:KT-0603R")
		(at 123.19 236.22 0)
		(mirror y)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "LED1"
			(at 124.46 227.33 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "KT-0603R"
			(at 124.46 229.87 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:LED0603-RD"
			(at 123.19 243.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Light-Emitting-Diodes-LED_Red-LED-0603_C2286.html"
			(at 123.19 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "LED"
			(at 123.19 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2286"
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Hubei KENTO Elec"
			(at 123.19 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "KT-0603R"
			(at 123.19 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 123.19 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2286.html"
			(at 123.19 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 123.19 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "LED1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0402WGF1581TCE")
		(at 175.26 50.8 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R18"
			(at 179.07 44.4499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.58kΩ"
			(at 179.07 46.9899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 184.15 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Others_Uniroyal-Elec-0402WGF1581TCE_C113483.html"
			(at 186.69 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 175.26 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C113483"
			(at 189.23 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 175.26 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0402WGF1581TCE"
			(at 175.26 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 175.26 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C113483.html"
			(at 175.26 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 368.3 243.84 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR014"
			(at 368.3 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 368.3 248.92 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 368.3 243.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 368.3 243.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 368.3 243.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:HCZZ0001-12")
		(at 260.35 172.72 0)
		(mirror y)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "CN6"
			(at 246.38 191.7699 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "HCZZ0001-12"
			(at 246.38 194.3099 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:CONN-SMD_HCZZ0001-12"
			(at 260.35 219.71 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C7433463.pdf"
			(at 260.35 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Connector Header 12 position 1.25mm Pitch 1A Surface Mount, Right Angle -25℃~+70℃"
			(at 260.35 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C7433463"
			(at 260.35 222.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Hong Cheng"
			(at 260.35 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "HCZZ0001-12"
			(at 260.35 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C7433463.html"
			(at 260.35 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "12")
		(pin "13")
		(pin "6")
		(pin "1")
		(pin "3")
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "9")
		(pin "11")
		(pin "10")
		(pin "7")
		(pin "14")
		(pin "8")
		(instances
			(project "lynx-mouse"
				(path
					(reference "CN6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A106MQ5NUNC")
		(at 304.8 50.8 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C19"
			(at 308.61 49.5299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "10µF"
			(at 308.61 52.0699 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 297.18 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A106MQ5NUNC_10uF-106-20-6-3V_C15525.html"
			(at 294.64 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 304.8 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C15525"
			(at 292.1 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 304.8 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A106MQ5NUNC"
			(at 304.8 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 304.8 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C15525.html"
			(at 304.8 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 304.8 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C19")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:DM-1A-135R-Z")
		(at 317.5 115.57 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "SW2"
			(at 321.31 112.6499 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "D2F-01"
			(at 321.31 115.1899 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SW-TH_DM-1A-135R-Z"
			(at 317.5 128.27 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C22459524.pdf"
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Microswitch"
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22459524"
			(at 317.5 130.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HanElectricity"
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "DM-1A-135R-Z"
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SIP-3P"
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22459524.html"
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 317.5 115.57 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "SW2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 354.33 207.01 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D13"
			(at 354.965 200.66 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 354.965 203.2 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 354.33 214.63 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 354.33 217.17 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 354.33 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 354.33 219.71 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 354.33 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 354.33 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 354.33 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 38.1 91.44 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR023"
			(at 38.1 97.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 38.1 96.52 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 38.1 91.44 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 38.1 91.44 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 38.1 91.44 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR023")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 48.26 199.39 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D14"
			(at 48.895 193.04 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 48.895 195.58 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 48.26 207.01 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 48.26 209.55 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 48.26 199.39 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 48.26 212.09 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 0 0 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 0 0 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 48.26 199.39 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 48.26 199.39 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 48.26 199.39 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D14")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Jumper:SolderJumper_3_Bridged12")
		(at 311.15 137.16 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom no)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "JP1"
			(at 313.69 135.8899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "SolderJumper_3_Bridged12"
			(at 313.69 138.4299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "Jumper:SolderJumper-3_P1.3mm_Bridged12_Pad1.0x1.5mm"
			(at 311.15 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 311.15 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "3-pole Solder Jumper, pins 1+2 closed/bridged"
			(at 311.15 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" ""
			(at 311.15 137.16 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" ""
			(at 311.15 137.16 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 311.15 137.16 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "JP1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CSA0402C0G120J500GT")
		(at 54.61 135.89 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "C12"
			(at 59.944 131.572 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "12pF"
			(at 59.944 134.112 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 54.61 146.05 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_12pF-120-5-50V_C50391.html"
			(at 54.61 135.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 54.61 135.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C18220923"
			(at 54.61 148.59 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0201CG120J500NT"
			(at 59.944 141.224 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 54.61 135.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0201"
			(at 54.61 135.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C50391.html"
			(at 54.61 135.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 54.61 135.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:KT-0603R")
		(at 198.12 254 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "PGLED1"
			(at 196.85 245.11 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "KT-0603R"
			(at 196.85 247.65 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:LED0603-RD"
			(at 198.12 261.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Light-Emitting-Diodes-LED_Red-LED-0603_C2286.html"
			(at 198.12 264.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "LED"
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2286"
			(at 198.12 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Hubei KENTO Elec"
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "KT-0603R"
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2286.html"
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Note" "Power Good indicator"
			(at 198.12 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "PGLED1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:3K32.768AQ")
		(at 69.85 165.1 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "X2"
			(at 74.93 158.7499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "3K32.768AQ"
			(at 74.93 161.2899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:OSC-SMD_L3.2-W1.5"
			(at 78.74 165.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C19723463.pdf"
			(at 69.85 165.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Crystal"
			(at 69.85 165.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19723463"
			(at 81.28 165.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "huaxindianzi"
			(at 69.85 165.1 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "3K32.768AQ"
			(at 69.85 165.1 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SMD3215-2P"
			(at 69.85 165.1 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19723463.html"
			(at 69.85 165.1 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "X2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL10A475KO8NNNC")
		(at 254 50.8 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C24"
			(at 257.81 46.9899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "4.7µF"
			(at 257.81 49.5299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0603"
			(at 246.38 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL10A475KO8NNNC_4-7uF-475-10-16V_C19666.html"
			(at 243.84 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 254 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14106"
			(at 240.03 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "35V"
			(at 257.81 52.0699 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "20%"
			(at 257.81 54.6099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19666"
			(at 241.3 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 254 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL10A475KO8NNNC"
			(at 254 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 254 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19666.html"
			(at 254 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 254 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C24")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL10A475KO8NNNC")
		(at 381 234.95 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C2"
			(at 384.81 231.1399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "4.7µF"
			(at 384.81 233.6799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0603"
			(at 373.38 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL10A475KO8NNNC_4-7uF-475-10-16V_C19666.html"
			(at 370.84 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 381 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14106"
			(at 367.03 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "35V"
			(at 384.81 236.2199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "20%"
			(at 384.81 238.7599 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19666"
			(at 368.3 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 381 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL10A475KO8NNNC"
			(at 381 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 381 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19666.html"
			(at 381 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 381 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 231.14 256.54 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR035"
			(at 231.14 262.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 231.14 261.62 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 231.14 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 231.14 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 231.14 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR035")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VBUS")
		(at 140.97 228.6 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR026"
			(at 140.97 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBUS"
			(at 140.97 223.52 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 140.97 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 140.97 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBUS\""
			(at 140.97 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR026")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V8")
		(at 304.8 38.1 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05"
			(at 304.8 41.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "+1V9"
			(at 304.8 33.02 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 304.8 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 304.8 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V9\""
			(at 304.8 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF220KT5E")
		(at 52.07 224.79 180)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R1"
			(at 52.07 218.44 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "2.2Ω"
			(at 52.07 220.98 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 52.07 217.17 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_2-2R-2R20-1_C22939.html"
			(at 52.07 214.63 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 52.07 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22939"
			(at 52.07 212.09 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 52.07 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF220KT5E"
			(at 52.07 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 52.07 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22939.html"
			(at 52.07 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 52.07 224.79 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:161N-4BVS11")
		(at 72.39 240.03 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U3"
			(at 71.12 250.19 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "161N-4BVS11"
			(at 71.12 252.73 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:USB-C-SMD_HANELECTRICITY_161N-4XVS11"
			(at 72.39 255.27 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C5440752.pdf"
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "USB Type-C connector"
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C5440752"
			(at 72.39 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HanElectricity"
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "161N-4BVS11"
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole"
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C5440752.html"
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 72.39 240.03 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "B6")
		(pin "A8")
		(pin "B7")
		(pin "0")
		(pin "B8")
		(pin "B5")
		(pin "A4B9")
		(pin "B1A12")
		(pin "A7")
		(pin "A6")
		(pin "A1B12")
		(pin "B4A9")
		(pin "A5")
		(instances
			(project ""
				(path
					(reference "U3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A105KA5NQNC")
		(at 292.1 50.8 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C22"
			(at 295.91 46.9899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.0µF"
			(at 295.91 49.5299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 284.48 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A105KA5NQNC_1uF-105-10-25V_C52923.html"
			(at 281.94 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 292.1 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14969"
			(at 275.59 49.53 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 295.91 52.0699 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 295.91 54.6099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C52923"
			(at 279.4 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 292.1 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A105KA5NQNC"
			(at 292.1 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 292.1 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C52923.html"
			(at 292.1 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 292.1 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C22")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 287.02 137.16 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D6"
			(at 287.655 130.81 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 287.655 133.35 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 287.02 144.78 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 287.02 147.32 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 287.02 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 287.02 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 287.02 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 287.02 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 287.02 137.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:D2F-01")
		(at 320.04 161.29 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "SW5"
			(at 320.04 152.4 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "D2F-01"
			(at 320.04 154.94 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SW-TH_D2F-01"
			(at 320.04 168.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Microswitches_Omron-Electronics-D2F-01_C397278.html"
			(at 320.04 171.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Microswitch"
			(at 320.04 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C397278"
			(at 320.04 173.99 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "OMRON"
			(at 320.04 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "D2F-01"
			(at 320.04 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole"
			(at 320.04 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C397278.html"
			(at 320.04 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 320.04 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "SW5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF1500T5E")
		(at 187.96 254 0)
		(mirror y)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R8"
			(at 187.96 247.65 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "150Ω"
			(at 187.96 250.19 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 187.96 261.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_150R-1500-1_C22808.html"
			(at 187.96 264.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 187.96 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22808"
			(at 187.96 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 187.96 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF1500T5E"
			(at 187.96 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 187.96 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22808.html"
			(at 187.96 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 187.96 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CSA0402C0G120J500GT")
		(at 54.61 151.13 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "C13"
			(at 59.944 146.812 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "12pF"
			(at 59.944 149.352 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 54.61 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_12pF-120-5-50V_C50391.html"
			(at 54.61 151.13 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 54.61 151.13 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C18220923"
			(at 54.61 163.83 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0201CG120J500NT"
			(at 59.944 156.464 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 54.61 151.13 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0201"
			(at 54.61 151.13 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C50391.html"
			(at 54.61 151.13 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 54.61 151.13 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 287.02 120.65 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D5"
			(at 287.655 114.3 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 287.655 116.84 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 287.02 128.27 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 287.02 130.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 287.02 120.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 287.02 133.35 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 287.02 120.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 287.02 120.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 287.02 120.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D5")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 279.4 38.1 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR043"
			(at 279.4 41.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 279.4 33.02 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 279.4 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 279.4 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 279.4 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR043")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "MCU_Nordic:nRF52833_QDxx")
		(at 119.38 129.54 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U2"
			(at 124.0633 198.12 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "nRF52833_QDxx"
			(at 124.0633 200.66 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "Package_DFN_QFN:QFN-40-1EP_5x5mm_P0.4mm_EP3.8x3.8mm_ThermalVias"
			(at 119.38 203.2 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://infocenter.nordicsemi.com/pdf/nRF52833_PS_v1.5.pdf"
			(at 102.87 81.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Multiprotocol BLE/ANT/2.4 GHz/802.15.4 Cortex-M4F SoC, QFN-40"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2895249"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "NORDIC"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "nRF52833-QDAA-R"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "QFN-40-EP"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2895249.html"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" "True"
			(at 119.38 129.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "18")
		(pin "30")
		(pin "20")
		(pin "19")
		(pin "28")
		(pin "11")
		(pin "25")
		(pin "29")
		(pin "12")
		(pin "36")
		(pin "38")
		(pin "35")
		(pin "37")
		(pin "24")
		(pin "41")
		(pin "23")
		(pin "1")
		(pin "34")
		(pin "33")
		(pin "15")
		(pin "8")
		(pin "26")
		(pin "17")
		(pin "27")
		(pin "21")
		(pin "16")
		(pin "40")
		(pin "7")
		(pin "5")
		(pin "6")
		(pin "13")
		(pin "10")
		(pin "9")
		(pin "32")
		(pin "4")
		(pin "39")
		(pin "31")
		(pin "2")
		(pin "3")
		(pin "14")
		(pin "22")
		(instances
			(project ""
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "PCM_SparkFun-PowerSymbol:VBATT")
		(at 317.5 228.6 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR028"
			(at 317.5 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBATT"
			(at 317.5 224.79 0)
			(show_name no)
			(do_not_autoplace yes)
		)
		(property "Footprint" ""
			(at 317.5 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 317.5 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBATT\""
			(at 317.5 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR028")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF1500T5E")
		(at 133.35 248.92 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R7"
			(at 133.35 242.57 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "150Ω"
			(at 133.35 245.11 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 133.35 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_150R-1500-1_C22808.html"
			(at 133.35 259.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22808"
			(at 133.35 261.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF1500T5E"
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22808.html"
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 133.35 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 187.96 222.25 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR027"
			(at 187.96 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 187.96 227.33 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 187.96 222.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 187.96 222.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 187.96 222.25 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR027")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:XL7EL89CKI-111YLC-32M")
		(at 80.01 116.84 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "X1"
			(at 81.28 123.1899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "32MHz"
			(at 81.28 125.7299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:CRYSTAL-SMD_4P-L2.0-W1.6-BL"
			(at 64.77 116.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C2965582.pdf"
			(at 80.01 116.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Crystal"
			(at 80.01 116.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2965582"
			(at 62.23 116.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "YXC Crystal Oscillators"
			(at 80.01 116.84 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "XL7EL89CKI-111YLC-32M"
			(at 80.01 116.84 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SMD2016-4P"
			(at 80.01 116.84 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2965582.html"
			(at 80.01 116.84 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "3")
		(pin "4")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "X1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 355.6 38.1 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR048"
			(at 355.6 41.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 355.6 33.02 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 355.6 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 355.6 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 355.6 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR048")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 287.02 149.86 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D7"
			(at 287.655 143.51 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 287.655 146.05 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 287.02 157.48 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 287.02 160.02 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 287.02 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 287.02 162.56 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 287.02 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 287.02 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 287.02 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0402WGF1581TCE")
		(at 356.87 44.45 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R16"
			(at 361.95 39.37 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.58kΩ"
			(at 361.95 41.91 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 356.87 53.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Others_Uniroyal-Elec-0402WGF1581TCE_C113483.html"
			(at 356.87 55.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 356.87 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C113483"
			(at 356.87 58.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 356.87 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0402WGF1581TCE"
			(at 356.87 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 356.87 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C113483.html"
			(at 356.87 44.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A106MQ5NUNC")
		(at 279.4 50.8 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C23"
			(at 283.21 49.5299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "10µF"
			(at 283.21 52.0699 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 271.78 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A106MQ5NUNC_10uF-106-20-6-3V_C15525.html"
			(at 269.24 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 279.4 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C15525"
			(at 266.7 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 279.4 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A106MQ5NUNC"
			(at 279.4 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 279.4 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C15525.html"
			(at 279.4 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 279.4 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C23")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A105KA5NQNC")
		(at 212.09 236.22 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C16"
			(at 215.9 232.4099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.0µF"
			(at 215.9 234.9499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 204.47 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A105KA5NQNC_1uF-105-10-25V_C52923.html"
			(at 201.93 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 212.09 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14969"
			(at 195.58 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 215.9 237.4899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 215.9 240.0299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C52923"
			(at 199.39 236.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 212.09 236.22 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A105KA5NQNC"
			(at 212.09 236.22 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 212.09 236.22 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C52923.html"
			(at 212.09 236.22 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 212.09 236.22 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 287.02 172.72 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D9"
			(at 287.655 166.37 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 287.655 168.91 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 287.02 180.34 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 287.02 182.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 287.02 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 287.02 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 287.02 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 287.02 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 287.02 172.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D9")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05B104KO5NNNC")
		(at 342.9 234.95 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C15"
			(at 346.71 231.1399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "0.1µF"
			(at 346.71 233.6799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 335.28 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05B104KO5NNNC_100nF-104-10-16V_C1525.html"
			(at 332.74 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 342.9 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-25565"
			(at 326.39 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 346.71 236.2199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 346.71 238.7599 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C1525"
			(at 330.2 234.95 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 342.9 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05B104KO5NNNC"
			(at 342.9 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 342.9 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C1525.html"
			(at 342.9 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 342.9 234.95 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C15")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 287.02 161.29 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D8"
			(at 287.655 154.94 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 287.655 157.48 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 287.02 168.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 287.02 171.45 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 287.02 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 287.02 173.99 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 287.02 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 287.02 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 287.02 161.29 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 44.45 266.7 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D2"
			(at 45.085 260.35 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 45.085 262.89 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 44.45 274.32 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 44.45 276.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 44.45 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 44.45 279.4 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 44.45 269.748 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 44.45 271.526 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 44.45 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 44.45 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 44.45 266.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "D2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 287.02 109.22 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D4"
			(at 287.655 102.87 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 287.655 105.41 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 287.02 116.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 287.02 119.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 287.02 109.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 287.02 121.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 287.02 109.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 287.02 109.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 287.02 109.22 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF1001T5E")
		(at 173.99 246.38 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R10"
			(at 176.53 245.1099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1kΩ"
			(at 176.53 247.6499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 166.37 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_1KR-1001-1_C21190.html"
			(at 163.83 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 173.99 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C21190"
			(at 161.29 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 173.99 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF1001T5E"
			(at 173.99 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 173.99 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C21190.html"
			(at 173.99 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 173.99 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R10")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VBUS")
		(at 118.11 228.6 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR037"
			(at 118.11 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBUS"
			(at 118.11 223.52 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 118.11 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 118.11 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBUS\""
			(at 118.11 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR037")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0402CG101J500NT")
		(at 68.58 67.31 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C7"
			(at 72.39 63.4999 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "100pF"
			(at 72.39 66.0399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 60.96 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_100pF-101-5-50V_C1546.html"
			(at 58.42 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 68.58 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-13458"
			(at 54.61 66.04 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "50V"
			(at 72.39 68.5799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 72.39 71.1199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C1546"
			(at 55.88 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 68.58 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0402CG101J500NT"
			(at 68.58 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 68.58 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C1546.html"
			(at 68.58 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 68.58 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 176.53 60.96 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR050"
			(at 176.53 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 176.53 66.04 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 176.53 60.96 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 176.53 60.96 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 176.53 60.96 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR050")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:D2F-01")
		(at 320.04 149.86 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "SW4"
			(at 320.04 140.97 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "D2F-01"
			(at 320.04 143.51 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SW-TH_D2F-01"
			(at 320.04 157.48 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Microswitches_Omron-Electronics-D2F-01_C397278.html"
			(at 320.04 160.02 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Microswitch"
			(at 320.04 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C397278"
			(at 320.04 162.56 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "OMRON"
			(at 320.04 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "D2F-01"
			(at 320.04 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole"
			(at 320.04 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C397278.html"
			(at 320.04 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 320.04 149.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "SW4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:RTT02220JTH")
		(at 87.63 265.43 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R13"
			(at 93.98 260.35 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "22Ω"
			(at 93.98 262.89 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 87.63 274.32 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount_22R-220-5_C102894.html"
			(at 87.63 276.86 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C102894"
			(at 87.63 279.4 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "LIZ"
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CR0402JF0220G"
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C100612.html"
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 87.63 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R13")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 48.26 139.7 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 48.26 146.05 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 48.26 144.78 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 48.26 139.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 48.26 139.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 48.26 139.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 167.64 99.06 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR021"
			(at 167.64 102.87 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 167.64 93.98 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 167.64 99.06 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 167.64 99.06 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 167.64 99.06 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR021")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL10A475KO8NNNC")
		(at 35.56 232.41 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C1"
			(at 39.37 228.5999 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "4.7µF"
			(at 39.37 231.1399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0603"
			(at 27.94 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL10A475KO8NNNC_4-7uF-475-10-16V_C19666.html"
			(at 25.4 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 35.56 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14106"
			(at 21.59 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "35V"
			(at 39.37 233.6799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "20%"
			(at 39.37 236.2199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19666"
			(at 22.86 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 35.56 232.41 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL10A475KO8NNNC"
			(at 35.56 232.41 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 35.56 232.41 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19666.html"
			(at 35.56 232.41 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 35.56 232.41 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:DM-1A-135R-Z")
		(at 317.5 104.14 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "SW1"
			(at 321.31 101.2199 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "D2F-01"
			(at 321.31 103.7599 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SW-TH_DM-1A-135R-Z"
			(at 317.5 116.84 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C22459524.pdf"
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Microswitch"
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C22459524"
			(at 317.5 119.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HanElectricity"
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "DM-1A-135R-Z"
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SIP-3P"
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C22459524.html"
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 317.5 104.14 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "SW1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:2541WR-05P")
		(at 71.12 185.42 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "U4"
			(at 71.12 182.8799 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "2541WR-06P"
			(at 71.12 185.4199 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:HDR-TH_5P-P2.54-H-M-W10.4"
			(at 71.12 198.12 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C5383098.pdf"
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Pin header"
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C5383098"
			(at 71.12 200.66 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "HanElectricity"
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "2541WR-05P"
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole,Right Angle,P=2.54mm"
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C5383098.html"
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 71.12 185.42 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "3")
		(pin "2")
		(pin "4")
		(pin "5")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 245.11 256.54 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR034"
			(at 245.11 262.89 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 245.11 261.62 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 245.11 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 245.11 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 245.11 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR034")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:C2012X5R1A336MTJ00E")
		(at 185.42 50.8 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C25"
			(at 190.5 54.6099 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "33µF"
			(at 190.5 57.1499 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0805"
			(at 185.42 68.58 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Others_TDK-C2012X5R1A336MTJ00E_C342635.html"
			(at 185.42 71.12 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 185.42 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C342635"
			(at 185.42 73.66 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "TDK"
			(at 185.42 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "C2012X5R1A336MTJ00E"
			(at 185.42 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0805"
			(at 185.42 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C342635.html"
			(at 185.42 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C25")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VDD")
		(at 330.2 38.1 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR047"
			(at 330.2 41.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VDD"
			(at 330.2 33.02 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 330.2 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 330.2 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VDD\""
			(at 330.2 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR047")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 279.4 55.88 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR046"
			(at 279.4 62.23 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 279.4 60.96 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 279.4 55.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 279.4 55.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 279.4 55.88 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR046")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 101.6 247.65 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR015"
			(at 101.6 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 101.6 252.73 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 101.6 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 101.6 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 101.6 247.65 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR015")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:KT-0603R")
		(at 123.19 248.92 0)
		(mirror y)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "LED2"
			(at 124.46 240.03 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "KT-0603R"
			(at 124.46 242.57 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:LED0603-RD"
			(at 123.19 256.54 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Light-Emitting-Diodes-LED_Red-LED-0603_C2286.html"
			(at 123.19 259.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "LED"
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C2286"
			(at 123.19 261.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Hubei KENTO Elec"
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "KT-0603R"
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C2286.html"
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 123.19 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "LED2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:DS8562-33S5")
		(at 276.86 245.11 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U7"
			(at 276.86 234.95 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "DS8562-33S5"
			(at 276.86 237.49 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOT-23-5_L3.0-W1.7-P0.95-LS2.8-BL"
			(at 276.86 255.27 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C5884114.pdf"
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "LDO regulator"
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C5884114"
			(at 276.86 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "DSTECH"
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "DS8562-33S5"
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "SOT23-5"
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C5884114.html"
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 276.86 245.11 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "5")
		(pin "3")
		(pin "4")
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "U7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+1V8")
		(at 368.3 38.1 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR019"
			(at 368.3 41.91 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "+1V9"
			(at 368.3 33.02 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 368.3 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 368.3 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"+1V9\""
			(at 368.3 38.1 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR019")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A105KA5NQNC")
		(at 57.15 67.31 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C6"
			(at 60.96 63.4999 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "1.0µF"
			(at 60.96 66.0399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 49.53 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A105KA5NQNC_1uF-105-10-25V_C52923.html"
			(at 46.99 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 57.15 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14969"
			(at 40.64 66.04 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 60.96 68.5799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 60.96 71.1199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C52923"
			(at 44.45 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 57.15 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A105KA5NQNC"
			(at 57.15 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 57.15 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C52923.html"
			(at 57.15 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 57.15 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 354.33 195.58 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D12"
			(at 354.965 189.23 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 354.965 191.77 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 354.33 203.2 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 354.33 205.74 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 354.33 195.58 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 354.33 208.28 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 322.326 183.134 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 354.33 195.58 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 354.33 195.58 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 354.33 195.58 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D12")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CSA0402C0G120J500GT")
		(at 54.61 111.76 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "C11"
			(at 59.944 107.442 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "12pF"
			(at 59.944 109.982 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 54.61 121.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_12pF-120-5-50V_C50391.html"
			(at 54.61 111.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 54.61 111.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C18220923"
			(at 54.61 124.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0201CG120J500NT"
			(at 59.944 117.094 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 54.61 111.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0201"
			(at 54.61 111.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C50391.html"
			(at 54.61 111.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 54.61 111.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL10A475KO8NNNC")
		(at 45.72 67.31 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C8"
			(at 49.53 63.4999 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "4.7µF"
			(at 49.53 66.0399 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0603"
			(at 38.1 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL10A475KO8NNNC_4-7uF-475-10-16V_C19666.html"
			(at 35.56 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 45.72 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-14106"
			(at 31.75 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "35V"
			(at 49.53 68.5799 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "20%"
			(at 49.53 71.1199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C19666"
			(at 33.02 67.31 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 45.72 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL10A475KO8NNNC"
			(at 45.72 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 45.72 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C19666.html"
			(at 45.72 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 45.72 67.31 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C8")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 27.94 191.77 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D16"
			(at 30.48 189.8649 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 30.48 192.4049 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 35.56 191.77 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 38.1 191.77 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 27.94 191.77 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 40.64 191.77 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 27.94 191.77 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 27.94 191.77 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 27.94 191.77 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 27.94 191.77 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 27.94 191.77 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D16")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 381 45.72 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR049"
			(at 381 52.07 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 381 50.8 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 381 45.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 381 45.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 381 45.72 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR049")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 90.17 232.41 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 90.17 238.76 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 90.17 237.49 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 90.17 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 90.17 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 90.17 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A106MQ5NUNC")
		(at 245.11 250.19 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C17"
			(at 248.92 248.9199 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "10µF"
			(at 248.92 251.4599 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 237.49 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A106MQ5NUNC_10uF-106-20-6-3V_C15525.html"
			(at 234.95 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 245.11 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C15525"
			(at 232.41 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 245.11 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A106MQ5NUNC"
			(at 245.11 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 245.11 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C15525.html"
			(at 245.11 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 245.11 250.19 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C17")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:D2F-01")
		(at 320.04 132.08 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp yes)
		(fields_autoplaced yes)
		(property "Reference" "SW3"
			(at 320.04 123.19 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "D2F-01"
			(at 320.04 125.73 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SW-TH_D2F-01"
			(at 320.04 139.7 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Microswitches_Omron-Electronics-D2F-01_C397278.html"
			(at 320.04 142.24 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Microswitch"
			(at 320.04 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C397278"
			(at 320.04 144.78 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "OMRON"
			(at 320.04 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "D2F-01"
			(at 320.04 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "Through Hole"
			(at 320.04 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C397278.html"
			(at 320.04 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 320.04 132.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "SW3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:L")
		(at 49.53 83.82 90)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "L2"
			(at 49.53 78.74 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "2.2nH"
			(at 49.53 81.28 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:L0402-R-RD"
			(at 49.53 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://www.lcsc.com/datasheet/C395061.pdf"
			(at 49.53 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Inductor"
			(at 49.53 83.82 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C395061"
			(at 49.53 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "FH"
			(at 49.53 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "VHF100505HQ2N2ST"
			(at 49.53 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 49.53 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C395061.html"
			(at 49.53 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 49.53 83.82 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "L2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05A106MQ5NUNC")
		(at 292.1 246.38 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C18"
			(at 295.91 245.1099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "10µF"
			(at 295.91 247.6499 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 284.48 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05A106MQ5NUNC_10uF-106-20-6-3V_C15525.html"
			(at 281.94 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 292.1 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C15525"
			(at 279.4 246.38 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 292.1 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05A106MQ5NUNC"
			(at 292.1 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 292.1 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C15525.html"
			(at 292.1 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 292.1 246.38 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C18")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:PESD3V3Y1BSFYL")
		(at 44.45 257.81 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(property "Reference" "D3"
			(at 45.085 251.46 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "PESD3V3Y1BSFYL"
			(at 45.085 254 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:SOD-962_L0.6-W0.3-BI"
			(at 44.45 265.43 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/presales_Nexperia-PESD3V3Y1BSFYL_C552535.html"
			(at 44.45 267.97 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "ESD diode"
			(at 44.45 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C552535"
			(at 44.45 270.51 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "PESD3V3Y1BSFYL"
			(at 31.75 256.54 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Nexperia"
			(at 37.592 259.08 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "DSN0603-2"
			(at 44.45 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C552535.html"
			(at 44.45 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 44.45 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "D3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:CL05B104KO5NNNC")
		(at 241.3 50.8 270)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C20"
			(at 245.11 46.9899 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "0.1µF"
			(at 245.11 49.5299 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:C0402"
			(at 233.68 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Multilayer-Ceramic-Capacitors-MLCC-SMD-SMT_SAMSUNG_CL05B104KO5NNNC_100nF-104-10-16V_C1525.html"
			(at 231.14 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Unpolarized capacitor"
			(at 241.3 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "PROD_ID" "CAP-25565"
			(at 224.79 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Voltage" "16V"
			(at 245.11 52.0699 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Tolerance" "10%"
			(at 245.11 54.6099 90)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C1525"
			(at 228.6 50.8 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "Samsung Electro-Mechanics"
			(at 241.3 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "CL05B104KO5NNNC"
			(at 241.3 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 241.3 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C1525.html"
			(at 241.3 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 241.3 50.8 90)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "C20")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VBUS")
		(at 231.14 228.6 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR032"
			(at 231.14 232.41 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBUS"
			(at 231.14 223.52 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 231.14 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 231.14 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBUS\""
			(at 231.14 228.6 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR032")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0402WGF1002TCE")
		(at 190.5 241.3 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R11"
			(at 190.5 234.95 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "10kΩ"
			(at 190.5 237.49 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0402"
			(at 190.5 248.92 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_10KR-1002-1_C25744.html"
			(at 190.5 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 190.5 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C25744"
			(at 190.5 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 190.5 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0402WGF1002TCE"
			(at 190.5 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0402"
			(at 190.5 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C25744.html"
			(at 190.5 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 190.5 241.3 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "R11")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 182.88 96.52 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR022"
			(at 182.88 102.87 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 182.88 101.6 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 182.88 96.52 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 182.88 96.52 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 182.88 96.52 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR022")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:VBUS")
		(at 205.74 250.19 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR038"
			(at 205.74 254 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "VBUS"
			(at 205.74 245.11 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 205.74 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 205.74 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"VBUS\""
			(at 205.74 250.19 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR038")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 140.97 251.46 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR025"
			(at 140.97 257.81 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "GND"
			(at 140.97 256.54 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" ""
			(at 140.97 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" ""
			(at 140.97 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 140.97 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(instances
			(project "lynx-mouse"
				(path
					(reference "#PWR025")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "EasyEDA:0603WAF1003T5E")
		(at 261.62 251.46 0)
		(unit 1)
		(body_style 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(in_pos_files yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R9"
			(at 261.62 245.11 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Value" "100kΩ"
			(at 261.62 247.65 0)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Footprint" "EasyEDA:R0603"
			(at 261.62 259.08 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Datasheet" "https://lcsc.com/product-detail/Chip-Resistor-Surface-Mount-UniOhm_100KR-1003-1_C25803.html"
			(at 261.62 261.62 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Description" "Resistor"
			(at 261.62 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "LCSC Part" "C25803"
			(at 261.62 264.16 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Manufacturer" "UNI-ROYAL"
			(at 261.62 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Mfr. Part" "0603WAF1003T5E"
			(at 261.62 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Package" "0603"
			(at 261.62 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Purchase Link" "https://www.lcsc.com/product-detail/C25803.html"
			(at 261.62 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(property "Original" ""
			(at 261.62 251.46 0)
			(hide yes)
			(show_name no)
			(do_not_autoplace no)
		)
		(pin "1")
		(pin "2")
		(instances
			(project "lynx-mouse"
				(path
					(reference "R9")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
	(embedded_fonts no)
)
